PART 6 Amendment to the Product Safety and Metrology (Amendment) (EU Exit) Regulations 2020

7
Schedule 4 makes amendment to the Product Safety and Metrology (Amendment) (EU Exit) Regulations 2020.
Reg. 7 in force at 31.12.2020 immediately before the coming into force of regulation 2(1) of the Product Safety and Metrology (Amendment) (EU Exit) Regulations 2020, see reg. 1(3)