SCHEDULE Designated Bodies

PART 11 Ministry of Housing, Communities and Local Government
AWM (Subsidiary) Ltd
Bristol and Bath Science Park Estate Management Company Limited
Building Regulations Advisory Committee
Commission for Local Administration in England
English Partnerships (LP) Limited
The Estuary Management Company Ltd
Homes and Communities Agency
The Housing Ombudsman
The Leasehold Advisory Service
NorwePP (NWDA Subsidiary) Limited
ONE NorthEast General Partner Limited
Regulator of Social Housing
UK Holocaust Memorial Ltd
Valuation Tribunal for England
Valuation Tribunal Service