. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (4.7.2020 at 00.01 a.m.) by The Health Protection (Coronavirus, Restrictions) (No. 2) (England) Regulations 2020 (S.I. 2020/684), regs. 1(2)(b), 2(1)(c)