PART 2 Grounds for termination: cases with gestational limit

3 Pregnancy not exceeding 12 weeks
A registered medical professional may terminate a pregnancy where a registered medical professional is of the opinion, formed in good faith, that the pregnancy has not exceeded its 12th week.

4 Risk to physical or mental health where pregnancy not exceeding 24 weeks
1 A registered medical professional may terminate a pregnancy where two registered medical professionals are of the opinion, formed in good faith, that—
(a) the pregnancy has not exceeded its 24th week; and
(b) the continuance of the pregnancy would involve risk of injury to the physical or mental health of the pregnant woman which is greater than if the pregnancy were terminated.
2 In forming an opinion as to the matter mentioned in paragraph (1)(b), account may be taken of the pregnant woman’s actual or reasonably foreseeable circumstances.