SCHEDULES

SCHEDULE 9 PROTECTIVE PROVISIONS

PART 3 FOR THE PROTECTION OF NATIONAL GRID AS ELECTRICITY AND GAS UNDERTAKER

33 Notices
The plans submitted to National Grid by the undertaker pursuant to paragraphs 25(1) and 26(1) must be sent to National Grid Plant Protection at plantprotection@nationalgrid.com or such other address as National Grid may from time to time appoint instead for that purpose and notify to the undertaker in writing.