SCHEDULES

SCHEDULE 9 PROTECTIVE PROVISIONS

PART 13 FOR THE PROTECTION OF NORTHERN POWERGRID (YORKSHIRE) PLC
168. For the protection of Northern Powergrid the following provisions have effect, unless otherwise agreed in writing between the undertaker and Northern Powergrid.
169. In this Part of this Schedule—
“alternative apparatus” means alternative apparatus adequate to enable Northern Powergrid to fulfil its statutory functions in a manner not less efficient than previously;
“apparatus” means electric lines or electrical plant (as defined in the Electricity Act 1989), belonging to or maintained by Northern Powergrid;
“functions” includes powers and duties;
“in”, in a context referring to apparatus or alternative apparatus in land, includes a reference to apparatus or alternative apparatus under, over or upon land; and
“Northern Powergrid” means Northern Powergrid (Yorkshire) Plc (company number 04112320) whose registered office is at Lloyds Court, 78 Grey Street, Newcastle Upon Tyne, NE1 6AF.
170. This Part of this Schedule does not apply to apparatus in respect of which the relations between the undertaker and Northern Powergrid are regulated by the provisions of Part 3 (street works in England and Wales) of the 1991 Act.
171. Regardless of the temporary prohibition or restriction of use of streets under the powers conferred by article 11 (temporary prohibition or restriction of use of streets ), Northern Powergrid is at entitled at all times to take all necessary access across any such street and to execute and do all such works and things in, upon or under any such street as may be reasonably necessary or desirable to enable it to maintain any apparatus which at the time of the prohibition or restriction was in that street.
172. Regardless of any provision in this Order or anything shown on the land plans, the undertaker must not acquire any apparatus otherwise than by agreement.
173. (1) If, in the exercise of the powers conferred by this Order, the undertaker acquires any interest in any land in which any apparatus is placed or over which access to any apparatus is enjoyed or requires that Northern Powergrid's apparatus is relocated or diverted, that apparatus must not be removed under this Part of this Schedule, and any right of Northern Powergrid to maintain that apparatus in that land and to gain access to it must not be extinguished, until alternative apparatus has been constructed and is in operation, and access to it has been provided by virtue of an easement for a tenure no less than exists in relation to the apparatus being relocated or diverted, all to the reasonable satisfaction of Northern Powergrid in accordance with sub-paragraphs (2) to (7).
Words in Sch. 9 para. 173(1) substituted (17.5.2021) by The Immingham Open Cycle Gas Turbine (Correction) Order 2021 (S.I. 2021/581), art. 1, Sch.
(2) If, for the purpose of executing any works in, on or under any land purchased, held, appropriated or used under this Order, the undertaker requires the removal of any apparatus placed in that land, the undertaker must give Northern Powergrid written notice of that requirement, together with a plan and section of the work proposed, and of the proposed position of the alternative apparatus to be provided or constructed and in that case (or if in consequence of the exercise of any of the powers conferred by this Order Northern Powergrid reasonably needs to remove any of its apparatus) the undertaker must, subject to sub-paragraph (3), afford to Northern Powergrid the necessary facilities and rights for the construction of alternative apparatus in other land of the undertaker and subsequently for the maintenance of that apparatus.
(3) If alternative apparatus or any part of such apparatus is to be constructed elsewhere than in other land of the undertaker, or the undertaker is unable to afford such facilities and rights as are mentioned in sub-paragraph (2) in the land in which the alternative apparatus or part of such apparatus is to be constructed, Northern Powergrid must, on receipt of a written notice to that effect from the undertaker, as soon as reasonably practicable and at the cost of the undertaker (subject to prior approval by the undertaker of its estimate of costs of doing so) use reasonable endeavours to obtain the necessary facilities and rights in the land in which the alternative apparatus is to be constructed.
(4) Any alternative apparatus to be constructed in land of the undertaker under this Part of this Schedule must be constructed in such manner and in such line or situation as may be agreed between Northern Powergrid and the undertaker or in default of agreement settled by arbitration in accordance with paragraph 185.
(5) Northern Powergrid must, after the alternative apparatus to be provided or constructed has been agreed or settled by arbitration in accordance with paragraph 185, and after the grant to Northern Powergrid of any such facilities and rights as are referred to in sub-paragraph (2) or (3) proceed without unnecessary delay to construct and bring into operation the alternative apparatus and subsequently to remove any apparatus required by the undertaker to be removed under the provisions of this Part of this Schedule.
(6) Regardless of anything in sub-paragraph (5), if the undertaker gives notice in writing to Northern Powergrid that it desires itself to execute any work, or part of any work, in connection with the construction or removal of apparatus in any land controlled by the undertaker, that work, instead of being executed by Northern Powergrid, must be executed by the undertaker without unnecessary delay under the superintendence, if given, and to the reasonable satisfaction of Northern Powergrid.
(7) Nothing in sub-paragraph (6) authorises the undertaker to place, install, bed, pack, remove, connect or disconnect any apparatus, or any fill around the apparatus (where the apparatus is laid in a trench) within 300 millimetres of the apparatus.
174. (1) Where, in accordance with the provisions of this Part of this Schedule, the undertaker affords to Northern Powergrid facilities and rights for the construction and maintenance in land of the undertaker of alternative apparatus in substitution for apparatus to be removed, those facilities and rights must be granted upon such terms and conditions as may be agreed between the undertaker and Northern Powergrid or in default of agreement settled by arbitration in accordance with paragraph 185.
(2) If the facilities and rights to be afforded by the undertaker in respect of any alternative apparatus, and the terms and conditions subject to which those facilities and rights are to be granted, are in the opinion of the arbitrator less favourable on the whole to Northern Powergrid than the facilities and rights enjoyed by it in respect of the apparatus to be removed and the terms and conditions to which those facilities and rights are subject, the arbitrator must make such provision for the payment of compensation by the undertaker to Northern Powergrid as appears to the arbitrator to be reasonable having regard to all the circumstances of the particular case.
175. (1) Not less than 90 days before starting the execution of any works in, on or under any land purchased, held, appropriated or used under this Order that are near to, or will or may affect, any apparatus the removal of which has not been required by the undertaker under paragraph 173(2), the undertaker must submit to Northern Powergrid a plan, section and description of the works to be executed.
(2) Those works must be executed only in accordance with the plan, section and description submitted under sub-paragraph (1) and in accordance with such reasonable requirements as may be made in accordance with sub-paragraph (3) by Northern Powergrid for the alteration or otherwise for the protection of the apparatus, or for securing access to it, and Northern Powergrid is entitled to watch and inspect the execution of those works.
(3) Any requirements made by Northern Powergrid under sub-paragraph (2) must be made within a period of 21 days beginning with the date on which a plan, section and description under sub-paragraph (1) are submitted to it.
(4) If Northern Powergrid in accordance with sub-paragraph (3) and in consequence of the works proposed by the undertaker, reasonably requires the removal of any apparatus and gives written notice to the undertaker of that requirement, paragraphs 168 to 174 apply as if the removal of the apparatus had been required by the undertaker under paragraph 173(2).
(5) Nothing in this paragraph precludes the undertaker from submitting at any time or from time to time, but in no case less than 28 days before commencing the execution of any works, a new plan, section and description instead of the plan, section and description previously submitted, and having done so the provisions of this paragraph apply to and in respect of the new plan, section and description.
(6) The undertaker is not required to comply with sub-paragraph (1) in a case of emergency but in that case it must give to Northern Powergrid notice as soon as is reasonably practicable and subsequently a plan, section and description of those works as soon as reasonably practicable and must comply with sub-paragraph (2) in so far as is reasonably practicable in the circumstances.
176. (1) Subject to the following provisions of this paragraph, the undertaker must repay to Northern Powergrid the reasonable expenses incurred by Northern Powergrid—
(a) in, or in connection with, the inspection, removal, alteration or protection of any apparatus or the construction of any new apparatus which may be required in consequence of the execution of any such works as are referred to in paragraph 173(2);and
(b) in assessing and preparing a design for its apparatus to address and accommodate the proposals of the undertaker whether or not the undertaker proceeds to implement those proposals or alternative or none at all,
provided that if it so prefers Northern Powergrid may abandon apparatus that the undertaker does not seek to remove in accordance with paragraph 173(2) having first decommissioned such apparatus.
(2) There is to be deducted from any sum payable under sub-paragraph (1) the value of any apparatus removed under the provisions of this Part of this Schedule, that value being calculated after removal and, if the apparatus removed under the provisions of this Part of this Schedule has no value, no sum is to be deducted from the amount payable under sub-paragraph (1).
(3) If in accordance with the provisions of this Part of this Schedule—
(a) apparatus of better type, of greater capacity or of greater dimensions is placed in substitution for existing apparatus of worse type, of smaller capacity or of smaller dimensions; or
(b) apparatus (whether existing apparatus or apparatus substituted for existing apparatus) is placed at a depth greater than the depth at which the existing apparatus was,
and the placing of apparatus of that type or capacity or of those dimensions or the placing of apparatus at that depth, as the case may be, is not agreed by the undertaker or, in default of agreement, is not determined by arbitration in accordance with paragraph 185 to be necessary, then, if such placing involves cost in the construction of works under this Part of this Schedule exceeding that which would have been involved if the apparatus placed had been of the existing type, capacity or dimensions, or at the existing depth, as the case may be, the amount which apart from this sub-paragraph would be payable to Northern Powergrid by virtue of sub-paragraph (1) is to be reduced by the amount of that excess save where it is not possible in the circumstances to obtain the existing type capacity or dimensions of apparatus or to lay it at the same depth as the existing apparatus being replaced in which case the full costs are to be borne by the undertaker.
(4) For the purposes of sub-paragraph (3)—
(a) an extension of apparatus to a length greater than the length of existing apparatus is not to be treated as a placing of apparatus of greater dimensions than those of the existing apparatus where such extension is required in consequence of the execution of any such works as are referred to in paragraph 173(2); and
(b) where the provision of a joint in a cable is agreed, or is determined to be necessary, the consequential provision of a jointing chamber or of a manhole is to be treated as if it also had been agreed or had been so determined.
(5) An amount which apart from this sub-paragraph would be payable to Northern Powergrid in respect of works by virtue of sub-paragraph (1) is to be reduced by the amount which represents that benefit if the works include the placing of apparatus provided in substitution for apparatus placed more than seven years and six months earlier so as to confer on Northern Powergrid any financial benefit by deferment of the time for renewal of the apparatus in the ordinary course....
Sch. 9 para. 176(5) comma omitted (17.5.2021) by virtue of The Immingham Open Cycle Gas Turbine (Correction) Order 2021 (S.I. 2021/581), art. 1, Sch.
177. (1) Subject to sub-paragraphs (2) and (3), if by reason or in consequence of the construction of any of the works referred to in paragraph 173(2), any damage is caused to any apparatus (other than apparatus the repair of which is not reasonably necessary in view of its intended removal for the purposes of those works) or property of Northern Powergrid, or there is any interruption in any service provided by Northern Powergrid, the undertaker must—
(a) bear and pay the cost reasonably incurred by Northern Powergrid in making good such damage or restoring the supply; and
(b) make reasonable compensation to Northern Powergrid for any other expenses, loss, damages, penalty or costs incurred by Northern Powergrid,
by reason or in consequence of any such damage or interruption.
(2) Nothing in sub-paragraph (1) imposes any liability on the undertaker with respect to any damage or interruption to the extent that it is attributable to the act, neglect or default of Northern Powergrid, its officers, servants, contractors or agents.
(3) Northern Powergrid must give the undertaker reasonable notice of any such claim or demand and no settlement or compromise is to be made without the consent of the undertaker which, if it withholds such consent, has the sole conduct of any settlement or compromise or of any proceedings necessary to resist the claim or demand.
178. Nothing in this Part of this Schedule affects any enactment or agreement regulating the relations between the undertaker and Northern Powergrid in respect of any apparatus laid or erected in land belonging to the undertaker on the date on which this Order is made.
179. (1) Without prejudice to the generality of this Part of this Schedule, Northern Powergrid must from time to time submit to the undertaker estimates of reasonable costs and expenses it expects to incur in relation to the implementation of any diversions or relocation of apparatus contemplated under this Part of this Schedule including without limitation—
(a) in assessing and preparing a design for its apparatus to address and accommodate the proposals of the undertaker under paragraph 176;
(b) costs incurred in fulfilling its obligations in paragraph 173(3);
(c) fees incurred in settling and completing and registering any documentation to secure rights for its diverted or relocated apparatus; and
(d) costs and expenses of contractors required to undertake any works for which Northern Powergrid is responsible and of purchasing the necessary cabling and associated apparatus,
provided that Northern Powergrid must use reasonable endeavours to minimise to a proper and reasonable level any charges, costs, fees and expenses to the extent that they are incurred.
180. Northern Powergrid and the undertaker must use their reasonable endeavours to agree the amount of any estimates submitted by Northern Powergrid under paragraph 179 within 15 working days following receipt of such estimates by the undertaker. The undertaker must confirm whether it agrees to the amount of such estimates in writing and must not unreasonably withhold or delay such agreement. If the parties are unable to agree the amount of an estimate, the dispute must be dealt with in accordance with paragraph 185.
181. Work in relation to which an estimate is submitted must not be commenced by Northern Powergrid until that estimate is agreed with the undertaker in writing and a purchase order up to the value of the approved estimate has been issued by the undertaker to Northern Powergrid and an easement for the routes of the apparatus has been granted to Northern Powergrid under paragraph 173(1) for the benefit of its statutory undertaking.
182. If Northern Powergrid at any time becomes aware that an estimate agreed is likely to be exceeded, it must forthwith notify the undertaker and must submit a revised estimate of the relevant costs and expenses to the undertaker for agreement.
183. Northern Powergrid may from time to time, and at least monthly, from the date of this Order issue to the undertaker invoices for costs and expenses incurred up to the date of the relevant invoice, for the amount of the relevant estimate agreed. Invoices issued to the undertaker for payment must—
(a) specify the approved purchase order number; and
(b) be supported by timesheets and narratives that demonstrate that the work invoiced has been completed in accordance with the agreed estimate.
184. The undertaker is not responsible for meeting costs or expenses in excess of an agreed estimate, other than where agreed under paragraph 181 or determined in accordance with paragraph 185.
185. Any difference under the provisions of this Part of this Schedule, unless otherwise provided for, is to be referred to and settled by a single arbitrator to be agreed between the parties or, failing agreement, to be appointed on the application of either party (after giving notice in writing to the other) by an independent electrical engineer by or on behalf of the President for the time being of the Institute of Engineering and Technology.

Sch. 9 para. 168 in force at 1.9.2020, see art. 1
Sch. 9 para. 169 in force at 1.9.2020, see art. 1
Sch. 9 para. 170 in force at 1.9.2020, see art. 1
Sch. 9 para. 171 in force at 1.9.2020, see art. 1
Sch. 9 para. 172 in force at 1.9.2020, see art. 1
Sch. 9 para. 173 in force at 1.9.2020, see art. 1
Sch. 9 para. 174 in force at 1.9.2020, see art. 1
Sch. 9 para. 175 in force at 1.9.2020, see art. 1
Sch. 9 para. 176 in force at 1.9.2020, see art. 1
Sch. 9 para. 177 in force at 1.9.2020, see art. 1
Sch. 9 para. 178 in force at 1.9.2020, see art. 1
Sch. 9 para. 179 in force at 1.9.2020, see art. 1
Sch. 9 para. 180 in force at 1.9.2020, see art. 1
Sch. 9 para. 181 in force at 1.9.2020, see art. 1
Sch. 9 para. 182 in force at 1.9.2020, see art. 1
Sch. 9 para. 183 in force at 1.9.2020, see art. 1
Sch. 9 para. 184 in force at 1.9.2020, see art. 1
Sch. 9 para. 185 in force at 1.9.2020, see art. 1