PART 3 Amendment of the Renewable Heat Incentive Scheme Regulations 2018

38 Amendment of regulation 18 (certification for installation of microgeneration heating equipment)
In regulation 18 (certification for installation of microgeneration heating equipment)—
(a) in paragraph (1)(b)(i)—
(i) omit “EN 45011 or”;
(ii) at the end insert “or a subsequent version of that standard”;
(b) in paragraph (2)(a), at the end insert “or a subsequent version of that standard”;
(c) in paragraph (2)(b), for the words from “air source heat pump,” to the end substitute—

“air source heat pump—
(i) Issue 1.0 of the document entitled “Microgeneration Installation Standard: MIS 3005-D The Heat Pump Standard (Design)”, published on 1st December 2021, or a subsequent version of that standard; and
Available at www.mcscertified.com.
(ii) Issue 1.0 of the document entitled “Microgeneration Installation Standard: MIS 3005-I The Heat Pump Standard (Installation)”, published on 1st December 2021, or a subsequent version of that standard; or
Available at www.mcscertified.com.”

;
(d) in paragraph (2)(c), for the words from “version” to the end substitute “Issue 5.0 of the document entitled “Microgeneration Installation Standard: MIS 3001 The Solar Thermal Standard (Installation)”, published on 1st December 2021, or a subsequent version of that standard”.
Available at www.mcscertified.com.