SCHEDULE 2 Scheme design requirement

Part 3 Viability certificate
10 The viability certificate must contain the information set out in paragraphs 11 to 14.
Sch. 2 para. 10 in force at 1.8.2022, see reg. 1(3)
11 The date which has been agreed in respect of the viability certificate in accordance with regulation 11(11).
Sch. 2 para. 11 in force at 1.8.2022, see reg. 1(3)
12 The name and contact details of the scheme actuary.
Sch. 2 para. 12 in force at 1.8.2022, see reg. 1(3)
13 The name of the scheme in respect of which the viability certificate is being obtained.
Sch. 2 para. 13 in force at 1.8.2022, see reg. 1(3)
14 A statement, signed by the scheme actuary, confirming that—
(a) in the scheme actuary’s opinion, the design of the scheme is sound;
(b) when providing the viability certificate, the scheme actuary has had regard to the matters specified in regulation 11(2), as applicable.
Sch. 2 para. 14 in force at 1.8.2022, see reg. 1(3)