SCHEDULES

SCHEDULE 9 PROTECTIVE PROVISIONS

PART 6 FOR THE PROTECTION OF NATIONAL GRID AS ELECTRICITY UNDERTAKER

Notices
69 Notwithstanding article 47 (service of notices), any plans submitted to National Grid by the undertaker pursuant to paragraph 62 must be sent to National Grid Plant Protection at plantprotection@nationalgrid.com or such other address as National Grid may from time to time appoint instead for that purpose and notify to the undertaker in writing.
Sch. 9 para. 69 in force at 2.6.2022, see art. 1