SCHEDULE 2 Requirements

19 Control of operational artificial light emissions
(1) Work No. 31A and Work No. 33(c) must not be brought into operation until a written scheme for the management and mitigation of internal and external artificial light emissions from Work No. 31A and Work No.33(c) has been submitted to and approved by the relevant planning authority.
(2) The approved scheme for the management and mitigation of artificial light emissions must be implemented and maintained during the lifetime of Work No. 31A and Work No. 33(c).