SCHEDULE 9 Protective provisions

PART 9 For the protection of Wales and West Utilities
100 In this Part—
“alternative apparatus” means alternative apparatus adequate to enable Wales and West Utilities to fulfil its statutory functions in a manner no less efficient than previously;
“apparatus” means any mains, pipes or other apparatus belonging to or maintained by Wales and West Utilities for the purposes of gas supply; including any structure in which apparatus is or is to be lodged or which will give access to apparatus;
“authorised development” has the same meaning as in article 2 (interpretation) of this Order and (unless otherwise specified) for the purposes of this Schedule shall include associated development and the use and maintenance of the authorised development;
“functions” includes powers and duties;
“in” in a context referring to apparatus or alternative apparatus in land includes a reference to apparatus or alternative apparatus under, over or upon land;
“plan” includes all designs, drawings, specifications, method statements, soil reports, programmes, calculations, risk assessments and other documents that are reasonably necessary properly and sufficiently to describe the works to be executed;
“security infrastructure” includes cameras, perimeter fencing, fencing and gates and any other security measures required in order to ensure an appropriate level of security in respect of the authorised development or any apparatus;
“specified work” means so much of any of the works comprised in the authorised development or activities undertaken in association with the authorised development which:
(a) are in, on or under any land purchased, leased, held, appropriated or used under this Order that are near to, or will or may affect, any apparatus the removal of which is not required under paragraph 104 of this Schedule; and/or
(b) will or may be situated within 4 metres measured in any direction of any security infrastructure belonging to or maintained by Wales and West Utilities;
“Wales and West Utilities” means Wales and West Utilities Limited (Company No. 05046791) whose registered office is at Wales & West House, Spooner Close Coedkernew, Newport, South Wales, NP10 8FZ.