SCHEDULE 9 Protective provisions

PART 11 For the protection of North Hoyle Wind Farm Limited

151 Carrying out of works
Either during the installation or as soon as practicable after the installation of the undertaker cables, the crossing points must be inspected by the undertaker or on its behalf, at the undertaker’s expense, by means of a remotely operated vehicle or by divers or such other method reasonably agreed by the Company, to ascertain that the undertaker cables and the Company cables have the agreed vertical separation distance at the crossing points in accordance with the method statement approved in accordance with paragraph 3 or deemed approved under paragraph 4. In the event that the undertaker cables and the Company cables have been adequately vertically separated then the undertaker must consult with the Company to determine the most appropriate course of action and the undertaker must, at its own expense then rectify the situation to provide such vertical separation.