SCHEDULE 9 Protective provisions

PART 4 For the protection of SP Manweb as electricity undertaker

48 Expenses
(1) Subject to the following provisions of this paragraph, the undertaker must pay to SP Manweb on demand all reasonable charges, costs and expenses reasonably incurred by SP Manweb in direct consequence of the execution of any authorised development including without limitation in respect of—
(a) any costs reasonably incurred by or compensation properly paid by SP Manweb in connection with the acquisition of rights or the exercise of statutory powers for such apparatus including without limitation all costs incurred by SP Manweb as a consequence of SP Manweb;
(i) using its own compulsory purchase powers to acquire any necessary rights under paragraph 45(3); and/or
(ii) exercising any compulsory purchase powers in the Order transferred to or benefitting SP Manweb;
(b) in connection with the cost of the carrying out of any diversion work or the provision of any alternative apparatus;
(c) the cutting off of any apparatus from any other apparatus or the making safe of redundant apparatus;
(d) the approval of plans;
(e) the carrying out of protective works (including any temporary protective works and their removal);
(f) the survey of any land, apparatus or works, the inspection and monitoring of works or the installation or removal of any temporary works reasonably necessary in consequence of the execution of any such works referred to in this Part of this Schedule.
(2) There will be deducted from any sum payable under sub-paragraph (1) the value of any apparatus removed under the provisions of this Part of this Schedule and which is not re-used as part of the alternative apparatus, that value being calculated after removal.
(3) If in accordance with the provisions of this Part of this Schedule—
(a) apparatus of better type, of greater capacity or of greater dimensions is placed in substitution for existing apparatus of worse type, of smaller capacity or of smaller dimensions; or
(b) apparatus (whether existing apparatus or apparatus substituted for existing apparatus) is placed at a depth greater than the depth at which the existing apparatus was situated,
and the placing of apparatus of that type or capacity or of those dimensions or the placing of apparatus at that depth, as the case may be, is not agreed by the undertaker or, in default of agreement, is not determined by arbitration in accordance with article 44 (arbitration) to be necessary, then, if such placing involves cost in the construction of works under this Part of this Schedule exceeding that which would have been involved if the apparatus placed had been of the existing type, capacity or dimensions, or at the existing depth, as the case may be, the amount which apart from this sub-paragraph would be payable to SP Manweb by virtue of sub-paragraph (1) will be reduced by the amount of that excess.
(4) For the purposes of sub-paragraph (3)—
(a) an extension of apparatus to a length greater than the length of existing apparatus will not be treated as a placing of apparatus of greater dimensions than those of the existing apparatus; and
(b) where the provision of a joint in a cable is agreed, or is determined to be necessary, the consequential provision of a jointing chamber or of a manhole will be treated as if it also had been agreed or had been so determined.
(5) An amount which apart from this sub-paragraph would be payable to SP Manweb in respect of works by virtue of sub-paragraph (1) must, if the works include the placing of apparatus provided in substitution for apparatus placed more than 7 years and 6 months earlier so as to confer on SP Manweb any financial benefit by deferment of the time for renewal of the apparatus in the ordinary course, be reduced by the amount which represents that benefit.