SCHEDULE Punishment of Offences under these Rules
Rule 183
(1) Rule creating the offence	(2) General nature of the offence	(3) Mode of prosecution	(4) Punishment	(5) Daily default fine (where applicable)
Rule 26(10)	Nuclear administrator failing to send report as to progress of relevant licensee nuclear company administration	Summary	Level 3 on the standard scale	One tenth of level 3 on the standard scale
Rule 100(2)	Failing to comply with nuclear administrator’s duties on vacating office	Summary	Level 3 on the standard scale	One tenth of level 3 on the standard scale
Rule 182	False representation of status for purpose of inspecting documents	1. On indictment 2. Summary	Two years or a fine or both Six months or a fine or both	