SCHEDULES

SCHEDULE 11 PROTECTIVE PROVISIONS

PART 1 FOR THE PROTECTION OF ELECTRICITY, GAS, WATER AND SEWERAGE UNDERTAKERS
5. Despite any provision in this Order or anything shown on the land plans, the undertaker must not acquire any apparatus otherwise than in accordance with this Part of this Schedule or by agreement.