PART 2 Amendment of the Building Regulations 2010

4 Amendments after regulation 2
After regulation 2 (interpretation) of the 2010 Regulations insert—

“2A Application
Subject to regulation 2B, these Regulations apply to all buildings in England including higher-risk buildings.

2B Disapplication of certain procedural requirements of the Building Regulations 2010 in relation to higher-risk building work
The following regulations do not apply to higher-risk building work—
(a) regulation 12 (giving of a building notice or an application for building control approval);
(b) regulation 13 (particulars and plans where a building notice is given);
(c) regulation 14 (applications for building control approval with full plans);
(d) regulations 14A (determination of applications for building control approval with full plans);
(e) regulation 14B (appeal against a local authority’s rejection of an application for building control approval);
(f) regulation 14C (appeal against the regulator’s rejection of an application for building control approval for work that is not higher-risk building work);
(g) regulation 15 (consultation with sewerage undertaker);
(h) regulation 15A (consultation in relation to fire safety);
(i) regulation 16 (notices in relation to building work);
(j) regulation 17 (completion certificates);
(k) regulation 17A (certificate for building occupied before work is completed);
(l) regulation 18 (unauthorised building work);
(m) regulation 18A (appeal against local authority’s refusal to grant certain certificates);
(n) regulation 18B (appeal to regulator in relation to certain decisions);
(o) regulation 19 (supervision of building work otherwise than by local authorities);
(p) regulation 38 (fire safety information);
(q) regulation 39 (information about ventilation);
(r) regulation 40 (information about use of fuel and power);
(s) regulation 40A (information about systems for on-site generation of electricity);
(t) regulation 40B (information about overheating).”

.