SCHEDULES

SCHEDULE 11 PROTECTIVE PROVISIONS

PART 1 FOR THE PROTECTION OF ELECTRICITY, GAS, WATER AND SEWERAGE UNDERTAKERS
11. Nothing in this Part of this Schedule affects the provisions of any enactment or agreement regulating the relations between the undertaker and a utility undertaking in respect of any apparatus laid or erected in land belonging to the undertaker on the date on which this Order is made.

Sch. 11 para. 11 in force at 13.3.2024, see art. 1