SCHEDULES

SCHEDULE 11 PROTECTIVE PROVISIONS

PART 7 FOR THE PROTECTION OF ANGLIAN WATER
77. For the protection of Anglian Water, the following provisions shall, unless otherwise agreed in writing between the undertaker and Anglian Water, have effect.
78. In this Part of this Schedule—
“alternative apparatus” means alternative apparatus adequate to enable Anglian Water to fulfil its statutory functions in no less efficient a manner than previously;
“Anglian Water” means Anglian Water Services Limited (company number 02366656) whose registered office is at Lancaster House, Lancaster Way, Ermine Business Park, Huntington, Cambridgeshire PE29 6XU;
“apparatus” means:
(a) works, mains, pipes or other apparatus belonging to or maintained by Anglian Water for the purposes of water supply and sewerage;
(b) any drain or works vested in Anglian Water under the Water Industry Act 1991;
(c) any sewer which is so vested or is the subject of a notice of intention to adopt given under section 102(4) of the Water Industry Act 1991 or an agreement to adopt made under section 104 of that Act;
(d) any drainage system constructed for the purpose of reducing the volume of surface water entering any public sewer belonging to Anglian water; and
(e) includes a sludge main, disposal main or sewer outfall and any manholes, ventilating shafts, pumps or other accessories forming part of any sewer, drain or works (within the meaning of section 219 of that Act) and any structure in which apparatus is or is to be lodged or which gives or will give access to apparatus,
and in this definition, expressions and words used in this definition and defined in section 219 (general interpretation) of the Water Industry Act 1991 have the same meaning as in that Act;
“functions” includes powers and duties;
“in” in a context referring to apparatus or alternative apparatus in land includes a reference to apparatus or alternative apparatus under, over or upon land; and
“plan” includes all designs, drawings, specifications, method statements, soil reports, programmes, calculations, risk assessments and other documents that are reasonably necessary properly and sufficiently to describe the works to be executed.

On street apparatus
79. This Part of this Schedule does not apply to apparatus in respect of which the relations between the undertaker and Anglian Water are regulated by the provisions of Part 3 of the 1991 Act.

Apparatus in stopped up streets
80. (1) Where any street is stopped up under article 11 (power to alter layout, etc., of streets), where Anglian Water has apparatus in the street or accessed by virtue of the street, it has the same powers and rights in respect of that apparatus as it enjoyed immediately before the stopping up and the undertaker must grant to Anglian Water legal easements reasonably satisfactory to Anglian Water in respect of such apparatus and access to it, but nothing in this paragraph affects any right of the undertaker or of Anglian Water to require the removal of that apparatus under paragraph 83 or the power of the undertaker to carry out works under paragraph 85.
(2) Regardless of the temporary stopping up or diversion of any highway under the powers conferred by article 13 (temporary prohibition or restriction of use of streets and public rights of way), Anglian Water is at liberty at all times to take all necessary access across any such stopped up highway and to execute and do all such works and things in, upon or under any such highway as may be reasonably necessary or desirable to enable it to maintain any apparatus which at the time of the stopping up or diversion was in that highway.

Protective works to buildings
81. The undertaker, in the case of the powers conferred by article 20 (protective works to buildings), must not exercise those powers so as to obstruct or render less convenient the access to any apparatus without the written consent of Anglian Water (such consent not to be unreasonably withheld or delayed).

Acquisition of land
82. Regardless of any provision in this Order or anything shown on the land plans, the undertaker must not acquire any apparatus otherwise than by agreement.

Removal of apparatus
83. (1) If, in the exercise of the powers conferred by this Order, the undertaker acquires any interest in any land in which any apparatus is placed or requires that Anglian Water’s apparatus is relocated or diverted, that apparatus must not be removed under this Part of this Schedule, and any right of Anglian Water to maintain that apparatus in that land must not be extinguished, until—
(a) alternative apparatus has been constructed and is in operation to the reasonable satisfaction of Anglian Water in accordance with sub-paragraphs (2) to (8); and
(b) facilities and rights have been secured for that alternative apparatus in accordance with paragraph 84.
(2) If, for the purpose of executing any works in, on or under any land purchased, held, appropriated or used under this Order, the undertaker requires the removal of any apparatus placed in that land, the undertaker must give to Anglian Water 28 days’ written notice of that requirement, together with a plan of the work proposed, and of the proposed position of the alternative apparatus to be provided or constructed and in that case (or if in consequence of the exercise of any of the powers conferred by this Order an undertaker reasonably needs to remove any of its apparatus) the undertaker must, subject to sub-paragraph (3), afford to Anglian Water the necessary facilities and rights for the construction of alternative apparatus in other land of the undertaker and subsequently for the maintenance of that apparatus.
(3) If alternative apparatus or any part of such apparatus is to be constructed elsewhere than in other land of the undertaker, or the undertaker is unable to afford such facilities and rights as are mentioned in sub-paragraph (2) in the land in which the alternative apparatus or part of such apparatus is to be constructed Anglian Water must, on receipt of a written notice to that effect from the undertaker, as soon as reasonably possible use its best endeavours to obtain the necessary facilities and rights in the land in which the alternative apparatus is to be constructed.
(4) Any alternative apparatus to be constructed in land of the undertaker under this Part of this Schedule must be constructed in such manner and in such line or situation as may be agreed between Anglian Water and the undertaker or in default of agreement settled by arbitration in accordance with article 46 (arbitration).
(5) Anglian Water must, after the alternative apparatus to be provided or constructed has been agreed or settled by arbitration in accordance with article 46, and after the grant to Anglian Water of any such facilities and rights as are referred to in sub-paragraphs (2) or (3), proceed without unnecessary delay to construct and bring into operation the alternative apparatus and subsequently to remove any apparatus required by the undertaker to be removed under the provisions of this Part of this Schedule.
(6) Regardless of anything in sub-paragraph (5), if Anglian Water gives notice in writing to the undertaker that it desires the undertaker to execute any work, or part of any work in connection with the construction or removal of apparatus in any land of the undertaker or to the extent that Anglian Water fails to proceed with that work in accordance with sub-paragraph (5) or the undertaker and Anglian Water otherwise agree, that work, instead of being executed by Anglian Water, must be executed by the undertaker without unnecessary delay under the superintendence, if given, and to the reasonable satisfaction of Anglian Water.
(7) If Anglian Water fails either reasonably to approve, or to provide reasons for its failure to approve along with an indication of what would be required to make acceptable, any proposed details relating to required removal works under sub-paragraph (2) within 28 days of receiving a notice of the required works from the undertaker, then such details are deemed to have been approved. For the avoidance of doubt, any such “deemed consent” does not extend to the actual undertaking of the removal works, which shall remain the sole responsibility of Anglian Water or its contractors.
(8) Whenever alternative apparatus is to be or is being substituted for existing apparatus, the undertaker shall, before taking or requiring any further step in such substitution works, use best endeavours to comply with Anglian Water’s reasonable requests for a reasonable period of time to enable Anglian Water to—
(a) make network contingency arrangements; or
(b) bring such matters as it may consider reasonably necessary to the attention of end users of the utility in question.

Facilities and rights for alternative apparatus
84. (1) Where, in accordance with the provisions of this Part of this Schedule, the undertaker affords to a utility undertaker facilities and rights for the construction and maintenance in land of the undertaker of alternative apparatus in substitution for apparatus to be removed, those facilities and rights are to be granted upon such terms and conditions as may be agreed between the undertaker and Anglian Water or in default of agreement settled by arbitration in accordance with article 46 (arbitration).
(2) If the facilities and rights to be afforded by the undertaker in respect of any alternative apparatus, and the terms and conditions subject to which those facilities and rights are to be granted, are in the opinion of the arbitrator less favourable on the whole to Anglian Water than the facilities and rights enjoyed by it in respect of the apparatus to be removed and the terms and conditions to which those facilities and rights are subject, the arbitrator must make such provision for the payment of compensation by the undertaker to Anglian Water as appears to the arbitrator to be reasonable having regard to all the circumstances of the particular case.
(3) Such facilities and rights as are set out in this paragraph are deemed to include any statutory permits granted to the undertaker in respect of the apparatus in question, whether under the Environmental Permitting Regulations 2010 or other legislation.

Retained apparatus
85. (1) Not less than 28 days before starting the execution of any works in, on or under any land purchased, held, appropriated or used under this Order that are near to, or will or may affect, any apparatus (or any means of access to it) the removal of which has not been required by the undertaker under paragraph 83(2), the undertaker must submit to Anglian Water a plan of the works to be executed.
(2) Those works must be executed only in accordance with the plan submitted under sub‑paragraph (1) and in accordance with such reasonable requirements as may be made in accordance with sub-paragraph (3) by Anglian Water for the alteration or otherwise for the protection of the apparatus, or for securing access to it, and Anglian Water is entitled to watch and inspect the execution of those works.
(3) Any requirements made by Anglian Water under sub-paragraph (2) must be made within a period of 21 days beginning with the date on which a plan under sub-paragraph (1) is submitted to it.
(4) If Anglian Water in accordance with sub-paragraph (3) and in consequence of the works proposed by the undertaker, reasonably requires the removal of any apparatus and gives written notice to the undertaker of that requirement, paragraphs 83 to 84 and 86 to 88 apply as if the removal of the apparatus had been required by the undertaker under paragraph 83(2).
(5) Nothing in this paragraph precludes the undertaker from submitting at any time or from time to time, but in no case less than 28 days before commencing the execution of any works, a new plan instead of the plan previously submitted, and having done so the provisions of this paragraph apply to and in respect of the new plan.
(6) The undertaker is not required to comply with sub-paragraph (1) in a case of emergency but in that case must give to Anglian Water notice as soon as is reasonably practicable and a plan of those works as soon as reasonably practicable subsequently and must comply with sub-paragraph (2) in so far as is reasonably practicable in the circumstances, using its reasonable endeavours to keep the impact of those emergency works on Anglian Water’s apparatus, on the operation of its water and sewerage network and on end-users of the services Anglian Water provides to a minimum.
(7) For the purposes of sub-paragraph (1) and without prejudice to the generality of the principles set out in that sub-paragraph, works are deemed to be in land near Anglian Water’s apparatus (where it is a pipe) if those works fall within the following distances measured from the medial line of such apparatus—
(a) 4 metres where the diameter of the pipe is less than 250 millimetres;
(b) 5 metres where the diameter of the pipe is between 250 and 400 millimetres, and
(c) a distance to be agreed on a case by case basis and before the submission of the plan under sub-paragraph (1) is submitted where the diameter of the pipe exceeds 400 millimetres.

Expenses and costs
86. (1) Subject to the following provisions of this paragraph, the undertaker must repay to Anglian Water all expenses reasonably incurred by Anglian Water in, or in connection with, the inspection, removal, alteration or protection of any apparatus or the construction of any new apparatus which may be required in consequence of the execution of any such works as are referred to in this Part of this Schedule.
(2) There must be deducted from any sum payable under sub-paragraph (1) the value of any apparatus removed under the provisions of this Part of this Schedule and which is not re-used as part of the alternative apparatus that value being calculated after removal.
(3) If in accordance with the provisions of this Part of this Schedule—
(a) apparatus of better type, of greater capacity or of greater dimensions is placed in substitution for existing apparatus of worse type, of smaller capacity or of smaller dimensions; or
(b) apparatus (whether existing apparatus or apparatus substituted for existing apparatus) is placed at a depth greater than the depth at which the existing apparatus was situated,
and the placing of apparatus of that type or capacity or of those dimensions or the placing of apparatus at that depth, as the case may be, is not agreed by the undertaker or, in default of agreement, is not determined by arbitration in accordance with article 46 (arbitration) to be necessary, then, if such placing involves cost in the construction of works under this Part of this Schedule exceeding that which would have been involved if the apparatus placed had been of the existing type, capacity or dimensions, or at the existing depth, as the case may be, the amount which apart from this sub-paragraph would be payable to Anglian Water by virtue of sub‑paragraph (1) must be reduced by the amount of that excess.
(4) For the purposes of sub-paragraph (3)—
(a) an extension of apparatus to a length greater than the length of existing apparatus is not to be treated as a placing of apparatus of greater dimensions than those of the existing apparatus; and
(b) where the provision of a joint in a pipe or cable is agreed, or is determined to be necessary, the consequential provision of a jointing chamber or of a manhole is to be treated as if it also had been agreed or had been so determined.
87. (1) Subject to sub-paragraphs (2) and (3), if by reason or in consequence of the construction of any such works referred to in paragraphs 81 or 83(2), or by reason of any subsidence resulting from such development or works, any damage is caused to any apparatus or alternative apparatus (other than apparatus the repair of which is not reasonably necessary in view of its intended removal for the purposes of those works) or property of Anglian Water, or there is any interruption in any service provided, or in the supply of any goods, by Anglian Water, the undertaker must—
(a) bear and pay the cost reasonably incurred by Anglian Water in making good such damage or restoring the supply; and
(b) make reasonable compensation to Anglian Water for any other expenses, loss, damages, penalty or costs incurred by Anglian Water,
by reason or in consequence of any such damage or interruption.
(2) The fact that any act or thing may have been done by Anglian Water on behalf of the undertaker or in accordance with a plan approved by Anglian Water or in accordance with any requirement of Anglian Water or under its supervision does not, subject to sub-paragraph (3), excuse the undertaker from liability under the provisions of sub-paragraph (1) unless Anglian Water fails to carry out and execute the works properly with due care and attention and in a skilful and professional like manner or in a manner that does not accord with the approved plan.
(3) Nothing in sub-paragraph (1) imposes any liability on the undertaker with respect to any damage or interruption to the extent that it is attributable to the unlawful or unreasonable act, neglect or default of Anglian Water, its officers, servants, contractors or agents.
(4) Anglian Water must give the undertaker reasonable notice of any such claim or demand and no settlement or compromise is to be made, without the consent of the undertaker (such consent not to be unreasonably withheld or delayed) who, if withholding such consent, has the sole conduct of any settlement or compromise or of any proceedings necessary to resist the claim or demand.

Cooperation
88. Where in consequence of the proposed construction of any of the authorised development, the undertaker or Anglian Water requires the removal of apparatus under paragraph 83(2) or Anglian Water makes requirements for the protection or alteration of apparatus under paragraph 85, the undertaker must use all reasonable endeavours to co-ordinate the execution of the works in the interests of safety and the efficient and economic execution of the authorised development and taking into account the need to ensure the safe and efficient operation of Anglian Water’s undertaking, using existing processes where requested by Anglian Water, provided it is appropriate to do so, and Anglian Water must use all reasonable endeavours to co-operate with the undertaker for that purpose.
89. Where the undertaker identifies any apparatus which may belong to or be maintainable by Anglian Water but which does not appear on any statutory map kept for the purpose by Anglian Water, it shall inform Anglian Water of the existence and location of the apparatus as soon as reasonably practicable.
90. Nothing in this Part of this Schedule affects the provisions of any enactment or agreement regulating the relations between the undertaker and Anglian Water in respect of any apparatus laid or erected in land belonging to the undertaker on the date on which this Order is made.
91. The undertaker and Anglian Water may by written agreement substitute any period of time for those periods set out in this Part of this Schedule.

Sch. 11 para. 77 in force at 13.3.2024, see art. 1
Sch. 11 para. 78 in force at 13.3.2024, see art. 1
Sch. 11 para. 79 in force at 13.3.2024, see art. 1
Sch. 11 para. 80 in force at 13.3.2024, see art. 1
Sch. 11 para. 81 in force at 13.3.2024, see art. 1
Sch. 11 para. 82 in force at 13.3.2024, see art. 1
Sch. 11 para. 83 in force at 13.3.2024, see art. 1
Sch. 11 para. 84 in force at 13.3.2024, see art. 1
Sch. 11 para. 85 in force at 13.3.2024, see art. 1
Sch. 11 para. 86 in force at 13.3.2024, see art. 1
Sch. 11 para. 87 in force at 13.3.2024, see art. 1
Sch. 11 para. 88 in force at 13.3.2024, see art. 1
Sch. 11 para. 89 in force at 13.3.2024, see art. 1
Sch. 11 para. 90 in force at 13.3.2024, see art. 1
Sch. 11 para. 91 in force at 13.3.2024, see art. 1