PART 4 MISCELLANEOUS AND GENERAL

40 Arbitration
Any difference under any provision of this Order, unless otherwise provided for, must be referred to and settled by a single arbitrator to be agreed between the parties or, failing agreement, to be appointed on the application of either party (after giving notice in writing to the other) by the President of the Institution of Civil Engineers.