SCHEDULE 1 Authorised project

PART 1 Authorised development
1 Nationally significant infrastructure projects as defined in sections 14 and 15 of the 2008 Act located in the North Sea approximately 14 kilometres and 25 kilometres to the north of the north Norfolk coast, comprising—

Sheringham Shoal Extension Project
Offshore works
Work No. 1A— in the event of scenario 1, scenario 2, scenario 3 or scenario 4, an offshore wind turbine generating station with a gross electrical output capacity of more than 100 megawatts comprising up to 23 wind turbine generators each fixed to the seabed by piled monopile, suction bucket monopile, piled jacket, suction bucket jacket or gravity base structure foundations;
Work No. 2A—
(a) in the event of scenario 1, scenario 2, scenario 3 or scenario 4, a network of subsea in- field cables between the wind turbine generators in Work No. 1A including cable protection and one or more cable crossings; and
(b) in the event of scenario 1, scenario 2 or scenario 3, a network of subsea in-field cables between the wind turbine generators in Work No. 1A and the offshore substation platform in Work No. 3A including cable protection and one or more cable crossings; or
(c) in the event of scenario 4, a network of subsea in-field cables between the wind turbine generators in Work No. 1A and the integrated offshore substation platform in Work No. 3C including cable protection and one or more cable crossings;
and associated development within the meaning of section 115(2) (development for which development consent may be granted) of the 2008 Act comprising—
Work No. 3A— in the event of scenario 1, scenario 2 or scenario 3, an offshore substation platform fixed to the seabed by either piled jacket or suction bucket jacket foundations within the area shown on the works plans;
Work No. 4A— in the event of scenario 1, scenario 2 or scenario 3, HVAC subsea export cables between Work No. 3A and Work No. 5A along routes within the area shown on the works plans including cable protection and one or more cable crossings;
Work No. 5A— in the event of scenario 1, scenario 2 or scenario 3, HVAC subsea export cables between Work No. 4A and Work No. 7A along routes within the area shown on the works plans including cable protection and one or more cable crossings;
Work No. 6A— in the event of scenario 1, scenario 2 or scenario 3, a temporary work area for vessels to carry out intrusive activities and non-intrusive activities alongside Work Nos. 1A, 2A, 3A, 4A and 5A;
Work No. 7A— in the event of scenario 1, scenario 2 or scenario 3, landfall connection works between Work No. 5A and Work No. 8A comprising of a cable circuit and ducts seaward of MHWS within the area shown on the works plans;

Onshore Works - In the County of Norfolk, districts of North Norfolk, Broadland and South Norfolk
Work No. 8A— in the event of scenario 1, scenario 2 or scenario 3, onshore connection works landward of MHWS consisting of a cable circuit and ducts between Work No. 7A and Work No. 9A and onshore construction works;
Work No. 9A— in the event of scenario 1, scenario 2 or scenario 3, onshore connection works consisting of—
(a) a transition joint bay;
(b) a cable circuit and ducts between Work No. 8A and Work No. 12A and in the event of scenario 2 only additional cable ducts for the Dudgeon Extension Project between Work No. 8B and Work No. 12B;
(c) a link box;
(d) horizontal directional drilling compound; and
(e) onshore construction works;
Work No. 10A— a temporary working area (including access) to facilitate Work Nos. 7A, 8A and 9A in the event of scenario 1, scenario 2 or scenario 3 or Work Nos. 7C, 8C and 9C in the event of scenario 4;
Work No. 11A— a permanent access to Work Nos. 7A, 8A and 9A in the event of scenario 1, scenario 2 or scenario 3 or Work Nos. 7C, 8C and 9C in the event of scenario 4;
Work No. 12A—
(a) in the event of scenario 1, a cable circuit and ducts between Work No. 9A and Work No. 15A and onshore construction works;
(b) in the event of scenario 2, a cable circuit and ducts between Work No. 9A and Work No. 15A, additional cable ducts for the Dudgeon Extension Project between Work No. 9B and Work No.15B and onshore construction works; or
(c) in the event of scenario 3, a cable circuit and ducts between Work No. 9A and Work No. 15C, onshore construction works and, in the event of sequential construction, may include additional cable ducts for the Dudgeon Extension Project between Work No. 9B and Work No.15C;
Work No. 13A— temporary vehicular access tracks to serve Work Nos. 7A, 8A, 9A, 11A, 12A, 13A and 14A in the event of scenario 1, scenario 2 or scenario 3 or Work Nos. 7C, 8C, 9C, 10A, 11A, 12C and 14A in the event of scenario 4;
Work No. 14A— construction compound areas to assist with the construction of Work Nos. 8A, 9A, 10A, 11A, 12A and 13A in the event of scenario 1, scenario 2 or scenario 3 or Work Nos. 8C, 9C, 10C, 11A, 12A and 13Cin the event of scenario 4;
Work No. 15A—
(a) in the event of scenario 1, an onshore HVAC substation, cable circuits and ducts and onshore construction works; or
(b) in the event of scenario 2, an onshore HVAC substation, cable circuits and ducts, additional cable ducts for the Dudgeon Extension Project and onshore construction works;
Work No.16A—
(a) in the event of scenario 1, a cable circuit and ducts between Work Nos. 15A and 17A, and onshore construction works; or
(b) in the event of scenario 2, a cable circuit and ducts between Work Nos. 15A and 17A, additional cable ducts for the Dudgeon Extension Project between Work No. 15B, and Work No. 17B and onshore construction works;
Work No. 17A— in the event of scenario 1 or scenario 2, works consisting of export cables and ducts between Work No. 16A and the Norwich Main National Grid substation, including a connection above ground and electrical engineering works within or around the National Grid substation buildings and compound and onshore construction works;
Work No. 18A— permanent works relating to Work Nos. 12A, 15A, 16A, 17A, 19A and 22A in the event of scenario 1 or scenario 2 or Work Nos. 12C, 15C, 16C, 17C, 19A and 22A in the event of scenario 3 or scenario 4, including—
(a) flood attenuation and drainage works;
(b) landscaping;
(c) ecological mitigation works; and
(d) onshore construction works;
Work No.19A— permanent accesses (including onshore construction works) in relation to Work Nos. 12A, 15A 16A, 17A, 18A and 22A in the event of scenario 1 or scenario 2 or Work Nos. 12C, 15C, 16C, 17C, 18A and 22A in the event of scenario 3 or scenario 4;
Work No. 20A— temporary working areas to facilitate Work Nos. 12A, 15A, 16A, 17A, 18A, 19A and 22A in the event of scenario 1 or scenario 2 or Work Nos. 12C, 15C, 16C, 17C, 18A, 19A and 22A, including—
(a) temporary works relating to traffic and highway management;
(b) temporary accesses; and
(c) onshore construction works;
Work No. 21A— not used;
Work No. 22A— permanent landscaping and ecological mitigation works (including onshore construction works) relating to Work Nos. 12A, 15A, 16A, 17A, 18A and 19A in the event of scenario 1 or scenario 2 or Work Nos. 12C, 15C, 16C, 17C, 18A and 19A in the event of scenario 3 or scenario 4.

Further Associated Development
In connection with such Work Nos. 1A to 7A and to the extent that they do not otherwise form part of any such work, further associated development comprising such other works as may be necessary or expedient for the purposes of or in connection with the relevant part of the authorised development and which fall within the scope of the work assessed by the environmental statement, including—
(a) scour protection around the foundations of the offshore structures;
(b) cable protection measures such as the placement of rock and/or concrete mattresses, with or without frond devices;
(c) the removal of material from the seabed required for the construction of Work Nos. 1A to 5A and 7A and the disposal of inert material of natural origin within the Order limits produced during construction drilling, seabed preparation for foundation works, cable installation preparation such as sandwave clearance, boulder clearance and pre-trenching and excavation of horizontal directional drilling exit pits;
(d) removal of static fishing equipment;
(e) temporary landing places, moorings or other means of accommodating vessels in the construction or maintenance of the authorised project; and
(f) disposal of drill arisings in connection with any foundation drilling up to a total of 12,371 cubic metres;
and in connection with such Work Nos. 8A to 22A and to the extent that they do not otherwise form part of any such work, further associated development comprising such other works as may be necessary or expedient for the purposes of or in connection with the relevant part of the authorised development and which fall within the scope of the work assessed by the environmental statement, including—
(a) ramps, means of access and footpaths;
(b) bunds, embankments, swales, landscaping, fencing and boundary treatments;
(c) habitat creation;
(d) jointing bays, link boxes, cable ducts, cable protection, joint protection, manholes, marker posts, underground cable markers, tiles and tape, lighting and other works associated with cable laying;
(e) works for the provision of apparatus including cabling, water and electricity supply works, foul drainage provision, surface water management systems and culverting;
(f) works to alter the position of apparatus, including mains, sewers, drains, cables and pipes;
(g) works to alter the course of, or otherwise interfere with, non-navigable rivers, streams or watercourses;
(h) landscaping and other works to investigate, ascertain or mitigate any adverse effects of the construction, maintenance or operation of the authorised project;
(i) works for the benefit or protection of land affected by the authorised project; and
(j) working sites in connection with the construction of the authorised project, construction lay down areas and compounds, storage compounds and their restoration.

Dudgeon Extension Project
Offshore works
Work No. 1B— in the event of scenario 1, scenario 2, scenario 3 or scenario 4, an offshore wind turbine generating station with a gross electrical output capacity of more than 100 megawatts comprising up to 30 wind turbine generators located either all in DEP North or split between DEP North and DEP South each fixed to the seabed by piled monopile, suction bucket monopile, piled jacket, suction bucket jacket or gravity base structure foundations;
Work No. 2B—
(a) in the event of scenario 1, scenario 2, scenario 3 or scenario 4, a network of subsea in- field cables between the wind turbine generators in Work No. 1B including cable protection and one or more cable crossings; and
(b) in the event of scenario 1, scenario 2 or scenario 3, a network of subsea in-field cables between the wind turbine generators in Work No. 1B and Work No. 3B including cable protection and one or more cable crossings;
and associated development within the meaning of section 115(2) (development for which development consent may be granted) of the 2008 Act comprising—
Work No. 3B— in the event of scenario 1, scenario 2 or scenario 3, an offshore substation platform fixed to the seabed by either piled jacket or suction bucket jacket foundations within the area shown on the works plans;
Work No. 4B— in the event of scenario 1, scenario 2 or scenario 3—
(a) interlink cables between DEP North and DEP South within the areas shown on the works plans; and
(b) HVAC subsea export cables between Work No. 3B and Work No. 5B along routes within the area shown on the works plans including cable protection and one or more cable crossings;
Work No. 5B— in the event of scenario 1, scenario 2, or scenario 3, HVAC subsea export cables between Work No. 4B and Work No. 7B along routes within the area shown on the works plans including cable protection and one or more cable crossings;
Work No. 6B— in the event of scenario 1, scenario 2 or scenario 3, a temporary work area for vessels to carry out intrusive activities and non-intrusive activities alongside Work Nos. 1B, 2B, 3B, 4B and 5B;
Work No. 7B— in the event of scenario 1, scenario 2, scenario 3, landfall connection works between Work No. 5B and Work No. 8B comprising of a cable circuit and ducts seaward of MHWS within the area shown on the works plans;

Onshore Works - in the County of Norfolk, districts of North Norfolk, Broadland and South Norfolk
Work No. 8B— in the event of scenario 1, scenario 2 or scenario 3 onshore connection works landward of MHWS consisting of a cable circuit and ducts between Work No. 7B and Work No. 9B and onshore construction works;
Work No. 9B— in the event of scenario 1, scenario 2 or scenario 3, onshore connection works consisting of—
(a) a transition joint bay;
(b) a cable circuit and ducts between Work No. 8B and Work No. 12B and in the event of scenario 2 only additional cable ducts for Sheringham Shoal Extension Project between Work No. 8A and Work No. 12A;
(c) a link box;
(d) horizontal directional drilling compound; and
(e) onshore construction works;
Work No. 10B— a temporary working area (including access) to facilitate Work Nos. 7B, 8B and 9B in the event of scenario 1, scenario 2 or scenario 3 or Work Nos. 7C, 8C and 9C in the event of scenario 4;
Work No. 11B— a permanent access to Work Nos. 7B, 8B and 9B in the event of scenario 1, scenario 2, or scenario 3 or Work Nos. 7C, 8C and 9C in the event of scenario 4;
Work No. 12B—
(a) in the event of scenario 1, a cable circuit and ducts between Work No. 9B and Work No. 15B and onshore construction works; or
(b) in the event of scenario 2, a cable circuit and ducts between Work No. 9B and Work No. 15B, additional cable ducts for the Sheringham Shoal Extension Project between Work No.9A and Work No.15A and onshore construction works; or
(c) in the event of scenario 3, a cable circuit and ducts between Work No. 9B and Work No. 15C, onshore construction works and, in the event of sequential construction, may include additional cable ducts for the Sheringham Shoal Extension Project between Work No. 9A and Work No. 15C;
Work No. 13B— temporary vehicular access tracks to serve Work Nos. 7B, 8B, 9B, 10B, 11B, 12B and 14B in the event of scenario 1, scenario 2 or scenario 3 or Work Nos. 7C, 8C, 9C, 10B, 11B, 12C and 14B in the event of scenario 4;
Work No. 14B— construction compound areas to assist with the construction of Work Nos. 7B, 8B, 9B, 10B, 11B, 12B and 13B in the event of scenario 1, scenario 2 or scenario 3 or Work Nos. 7C, 8C, 9C, 10B, 11B, 12C and 13B in the event of scenario 4;
Work No. 15B—
(a) in the event of scenario 1, an onshore HVAC substation, cable circuits and ducts and onshore construction works; or
(b) an in the event of scenario 2, an onshore HVAC substation, cable circuits and ducts, additional cable ducts for the Sheringham Shoal Extension Project and onshore construction works;
Work No.16B—
(a) in the event of scenario 1, a cable circuit and ducts between Work Nos. 15B and 17B, and onshore construction works; or
(b) in the event of scenario 2, a cable circuit and ducts between Work Nos. 15B and 17B, additional cable ducts for the Sheringham Shoal Extension Project between Work No. 15A and Work No. 17A, and onshore construction works;
Work No. 17B— in the event of scenario 1 or scenario 2, works consisting of export cables and ducts between Work No. 16B and the Norwich Main National Grid substation, including a connection above ground and electrical engineering works within or around the National Grid substation buildings and compound and onshore construction works;
Work No. 18B— permanent works relating to Works Nos. 12B, 15B, 16B, 17B, 19B and 22B in the event of scenario 1 or scenario 2 or Work Nos. 12C, 15C, 16C, 17C, 19B and 22B in the event of scenario 3 or scenario 4, including—
(a) flood attenuation and drainage works;
(b) landscaping;
(c) ecological mitigation works; and
(d) onshore construction works;
Work No. 19B— permanent accesses (including onshore construction works) in relation to Work Nos. 12B, 15B 16B, 17B, 18B and 22B in the event of scenario 1 or scenario 2 or Work Nos. 12C, 15C, 16C, 17C, 18B and 22B in the event of scenario 3 or scenario 4;
Work No. 20B— temporary working areas to facilitate Work Nos. 12B, 15B, 16B, 17B, 18B, 19B and 22B in the event of scenario 1 or scenario 2 or Work Nos. 12C, 15C, 16C, 17C, 18B, 19B and 22B in the event of scenario 3 or scenario 4 including—
(a) temporary works relating to traffic and highway management;
(b) temporary accesses; and
(c) onshore construction works;
Work No. 21B— not used;
Work No. 22B— permanent landscaping and ecological mitigation works (including onshore construction works) relating to Work Nos. 12B, 15B, 16B, 17B, 18B and 19B in the event of scenario 1 or scenario 2 or Work Nos. 12C, 15C, 16C, 17C, 18B and 19B in the event of scenario 3 or scenario 4.

Further Associated Development
In connection with such Work Nos. 1B to 7B and to the extent that they do not otherwise form part of any such work, further associated development comprising such other works as may be necessary or expedient for the purposes of or in connection with the relevant part of the authorised development and which fall within the scope of the work assessed by the environmental statement, including—
(a) scour protection around the foundations of the offshore structures;
(b) cable protection measures such as the placement of rock and/or concrete mattresses, with or without frond devices;
(c) the removal of material from the seabed required for the construction of Work Nos. 1B to 7B and the disposal of inert material of natural origin within the Order limits produced during construction drilling, seabed preparation for foundation works, cable installation preparation such as sandwave clearance, boulder clearance and pre-trenching and excavation of horizontal directional drilling exit pits;
(d) removal of static fishing equipment;
(e) temporary landing places, moorings or other means of accommodating vessels in the construction or maintenance of the authorised development; and
(f) disposal of drill arisings in connection with any foundation drilling up to a total of 12,371 cubic metres;
and in connection with such Work Nos. 8B to 22B and to the extent that they do not otherwise form part of any such work, further associated development comprising such other works as may be necessary or expedient for the purposes of or in connection with the relevant part of the authorised development and which fall within the scope of the work assessed by the environmental statement, including—
(a) ramps, means of access and footpaths;
(b) bunds, embankments, swales, landscaping, fencing and boundary treatments;
(c) habitat creation;
(d) jointing bays, link boxes, cable ducts, cable protection, joint protection, manholes, marker posts, underground cable markers, tiles and tape, lighting and other works associated with cable laying;
(e) works for the provision of apparatus including cabling, water and electricity supply works, foul drainage provision, surface water management systems and culverting;
(f) works to alter the position of apparatus, including mains, sewers, drains, cables and pipes;
(g) works to alter the course of, or otherwise interfere with, non-navigable rivers, streams or watercourses;
(h) landscaping and other works to investigate, ascertain or mitigate any adverse effects of the construction, maintenance or operation of the authorised project;
(i) works for the benefit or protection of land affected by the authorised project; and
(j) working sites in connection with the construction of the authorised project, construction lay down areas and compounds, storage compounds and their restoration;

Sheringham Shoal and Dudgeon Extension Projects Integrated works
Offshore Integrated Works
Work No. 3C— in the event of scenario 4, an integrated offshore substation platform fixed to the seabed by either piled jacket or suction bucket jacket foundations within the area shown on the works plans;
Work No. 4C— in the event of scenario 4—
(a) interlink cables between DEP North and Work No. 3C and DEP South and Work No. 3C; and
(b) HVAC subsea export cables between Work no. 3C and Work Nos. 5C along routes within the area shown on the works plans including cable protection and one or more cable crossings;
Work No. 5C— in the event of scenario 4, HVAC subsea export cables between Work No. 4C and Work No. 7C along routes within the area shown on the works plans including cable protection and one or more cable crossings;
Work No. 6C— in the event of scenario 4, a temporary work area for vessels to carry out intrusive activities and non-intrusive activities alongside Work Nos. 1A, 1B, 2A, 2B, 3C, 4C and 5C;
Work No. 7C— in the event of scenario 4, landfall connection works between Work No. 5C and Work No. 8C comprising of up to 2 cable circuits and ducts seaward of MHWS within the area shown on the works plans;
Onshore Integrated Works
Work No. 8C— in the event of scenario 4, onshore connection works landward of MHWS consisting of up to 2 cable circuits and ducts between Work No. 7C and Work No. 9C and onshore construction works;
Work No. 9C— in the event of scenario 4, onshore connection works consisting of—
(a) a transition joint bay;
(b) up to 2 cable circuits and ducts between Work No. 8C and Work No. 12C;
(c) a link box;
(d) horizontal directional drilling compound; and
(e) onshore construction works;
Work No. 12C— in the event of scenario 4, up to 2 cable circuits and ducts between Work No. 8C and Work No. 14C and onshore construction works;
Work No. 15C— in the event of scenario 3 or scenario 4, an integrated onshore substation, cable circuits and ducts and onshore construction works;
Work No. 16C— in the event of scenario 3 or scenario 4, up to two cable circuit and ducts between Work Nos. 14C and 16C, and onshore construction works;
Work No. 17C— in the event of scenario 3 or scenario 4, works consisting of export cables and ducts between Work No. 16C and the Norwich Main National Grid substation, including a connection above ground and electrical engineering works within or around the National Grid substation buildings and compound and onshore construction works.

Further Associated Development
In connection with Work Nos. 3C, 4C, 5C and 7C and to the extent that they do not otherwise form part of any such work, further associated development comprising such other works as may be necessary or expedient for the purposes of or in connection with the relevant part of the authorised development and which fall within the scope of the work assessed by the environmental statement, including—
(a) scour protection around the foundations of the offshore structures;
(b) cable protection measures such as the placement of rock and/or concrete mattresses, with or without frond devices;
(c) the removal of material from the seabed required for the construction of Work Nos. 3C, 4C, 5C and 7C and the disposal of inert material of natural origin within the Order limits produced during construction drilling, seabed preparation for foundation works, cable installation preparation such as sandwave clearance, boulder clearance and pre-trenching and excavation of horizontal directional drilling exit pits;
(d) removal of static fishing equipment;
(e) temporary landing places, moorings or other means of accommodating vessels in the construction or maintenance of the authorised project; and
(f) disposal of drill arisings in connection with any foundation drilling up to a total of 425 cubic metres;
and in connection with such Work Nos. 8C, 9C, 12C, 15C, 16C and 17C and to the extent that they do not otherwise form part of any such work, further associated development comprising such other works as may be necessary or expedient for the purposes of or in connection with the relevant part of the authorised development and which fall within the scope of the work assessed by the environmental statement, including—
(a) ramps, means of access and footpaths;
(b) bunds, embankments, swales, landscaping, fencing and boundary treatments;
(c) habitat creation;
(d) jointing bays, link boxes, cable ducts, cable protection, joint protection, manholes, marker posts, underground cable markers, tiles and tape, lighting and other works associated with cable laying;
(e) works for the provision of apparatus including cabling, water and electricity supply works, foul drainage provision, surface water management systems and culverting;
(f) works to alter the position of apparatus, including mains, sewers, drains, cables and pipes;
(g) works to alter the course of, or otherwise interfere with, non-navigable rivers, streams or watercourses;
(h) landscaping and other works to investigate, ascertain or mitigate any adverse effects of the construction, maintenance or operation of the authorised project;
(i) works for the benefit or protection of land affected by the authorised project; and
(j) working sites in connection with the construction of the authorised project, construction lay down areas and compounds, storage compounds and their restoration.
2 The grid coordinates for that part of the authorised development which is seaward of MHWS are specified below—
Point ID	Latitude (DMS)	Longitude (DMS)
1	52° 57′ 0,139″ N	1° 8′13,019″ E
2	52° 57′ 0,150″ N	1° 8′12,936″ E
3	52° 57′ 0,192″ N	1° 8′ 12,620″ E
4	52° 57′ 0,286″ N	1° 8′ 11,866″ E
5	52° 57′ 0,398″ N	1° 8′ 11,011″ E
6	52° 57′ 0,404″ N	1° 8′ 10,963″ E
7	52° 57′ 0,502″ N	1° 8′ 10,178″ E
8	52° 57′ 0,652″ N	1° 8′ 9,128″ E
9	52° 57′ 0,775″ N	1° 8′ 8,217″ E
10	52° 57′ 1,013″ N	1° 8′ 6,561″ E
11	52° 57′ 1,225″ N	1° 8′ 5,022″ E
12	52° 57′ 1,257″ N	1° 8′ 4,784″ E
13	52° 57′ 1,415″ N	1° 8′ 3,615″ E
14	52° 57′ 1,473″ N	1° 8′ 3,101″ E
15	52° 57′ 1,634″ N	1° 8′ 1,883″ E
16	52° 57′ 1,757″ N	1° 8′ 1,003″ E
17	52° 57′ 1,860″ N	1° 8′ 0,138″ E
18	52° 57′ 1,929″ N	1° 7′ 59,601″ E
19	52° 57′ 1,966″ N	1° 7′ 59,330″ E
20	52° 57′ 2,040″ N	1° 7′ 58,853″ E
21	52° 57′ 2,142″ N	1° 7′ 58,179″ E
22	52° 57′ 2,239″ N	1° 7′ 57,564″ E
23	52° 57′ 2,336″ N	1° 7′ 56,932″ E
24	52° 57′ 2,415″ N	1° 7′ 56,417″ E
25	52° 57′ 2,534″ N	1° 7′ 55,487″ E
26	52° 57′ 2,589″ N	1° 7′ 55,055″ E
27	52° 57′ 2,607″ N	1° 7′ 54,919″ E
28	52° 57′ 2,696″ N	1° 7′ 54,127″ E
29	52° 57′ 2,768″ N	1° 7′ 53,322″ E
30	52° 57′ 2,880″ N	1° 7′ 52,285″ E
31	52° 57′ 2,897″ N	1° 7′ 52,130″ E
32	52° 57′ 3,257″ N	1° 7′ 49,886″ E
33	52° 57′ 5,555″ N	1° 7′ 35,579″ E
34	52° 57′ 5,611″ N	1° 7′ 35,229″ E
35	52° 57′ 5,909″ N	1° 7′ 33,373″ E
36	52° 57′ 5,934″ N	1° 7′ 33,220″ E
37	52° 57′ 5,939″ N	1° 7′ 33,185″ E
38	52° 57′ 6,008″ N	1° 7′ 32,757″ E
39	52° 57′ 6,023″ N	1° 7′ 32,667″ E
40	52° 57′ 6,120″ N	1° 7′ 32,062″ E
41	52° 57′ 6,123″ N	1° 7′ 32,042″ E
42	52° 57′ 6,154″ N	1° 7′ 31,846″ E
43	52° 57′ 10,740″ N	1° 7′ 36,861″ E
44	52° 57′ 19,050″ N	1° 7′ 45,934″ E
45	52° 57′ 20,580″ N	1° 7′ 46,841″ E
46	52° 57′ 26,870″ N	1° 7′ 48,679″ E
47	52° 57′ 48,440″ N	1° 7′ 54,772″ E
48	52° 57′ 58,800″ N	1° 8′ 4,605″ E
49	52° 58′ 12,220″ N	1° 8′ 34,066″ E
50	52° 58′ 34,950″ N	1° 9′ 36,262″ E
51	52° 59′ 22,990″ N	1° 10′ 43,822″ E
55	53° 0′ 30,361″ N	1° 12′ 15,823″ E
56	53° 0′ 46,686″ N	1° 12′ 29,296″ E
57	53° 1′ 11,064″ N	1° 12′ 51,625″ E
58	53° 1′ 37,543″ N	1° 13′ 26,533″ E
59	53° 1′ 57,649″ N	1° 13′ 52,984″ E
60	53° 2′ 5,064″ N	1° 14′ 0,477″ E
61	53° 2′ 8,039″ N	1° 14′ 2,369″ E
62	53° 2′ 13,073″ N	1° 14′ 5,569″ E
63	53° 2′ 21,996″ N	1° 14′ 11,241″ E
64	53° 3′ 11,052″ N	1° 14′ 33,328″ E
65	53° 4′ 6,456″ N	1° 14′ 56,808″ E
66	53° 4′ 20,142″ N	1° 15′ 3,361″ E
67	53° 4′ 48,003″ N	1° 14′ 37,022″ E
68	53° 5′ 0,824″ N	1° 14′ 22,104″ E
69	53° 5′ 24,774″ N	1° 12′ 46,325″ E
70	53° 5′ 47,202″ N	1° 13′ 1,718″ E
71	53° 5′ 47,266″ N	1° 13′ 1,677″ E
72	53° 5′ 47,266″ N	1° 13′ 1,676″ E
73	53° 5′ 47,540″ N	1° 13′ 1,498″ E
74	53° 5′ 47,545″ N	1° 13′ 1,495″ E
75	53° 5′ 50,444″ N	1° 12′ 59,604″ E
76	53° 5′ 50,506″ N	1° 12′ 59,565″ E
77	53° 6′ 19,018″ N	1° 12′ 40,975″ E
78	53° 6′ 19,097″ N	1° 12′ 40,924″ E
79	53° 6′ 42,962″ N	1° 12′ 25,364″ E
80	53° 6′ 43,080″ N	1° 12′ 25,287″ E
81	53° 7′ 12,739″ N	1° 12′ 5,962″ E
82	53° 7′ 42,397″ N	1° 11′ 46,630″ E
83	53° 8′ 12,055″ N	1° 11′ 27,290″ E
84	53° 8′ 41,711″ N	1° 11′ 7,942″ E
85	53° 8′ 41,717″ N	1° 11′ 7,938″ E
86	53° 8′ 49,191″ N	1° 11′ 3,065″ E
87	53° 8′ 49,206″ N	1° 11′ 3,056″ E
88	53° 8′ 57,559″ N	1° 10′ 57,610″ E
89	53° 8′ 57,564″ N	1° 10′ 57,607″ E
90	53° 8′ 58,833″ N	1° 10′ 56,779″ E
91	53° 8′ 58,859″ N	1° 10′ 56,762″ E
92	53° 9′ 10,110″ N	1° 10′ 9,689″ E
93	53° 9′ 21,357″ N	1° 9′ 22,609″ E
94	53° 9′ 32,598″ N	1° 8′ 35,522″ E
95	53° 9′ 43,834″ N	1° 7′ 48,428″ E
96	53° 9′ 55,065″ N	1° 7′ 1,328″ E
97	53° 10′ 6,290″ N	1° 6′ 14,221″ E
98	53° 10′ 17,511″ N	1° 5′ 27,107″ E
99	53° 10′ 28,726″ N	1° 4′ 39,986″ E
100	53° 10′ 22,650″ N	1° 4′ 36,278″ E
101	53° 10′ 42,669″ N	1° 3′ 5,384″ E
102	53° 11′ 0,670″ N	1° 1′ 43,552″ E
103	53° 14′ 54,927″ N	1° 5′ 27,526″ E
104	53° 10′ 44,373″ N	1° 12′ 1,895″ E
105	53° 11′ 13,860″ N	1° 12′ 11,123″ E
106	53° 19′ 22,035″ N	1° 14′ 44,392″ E
107	53° 19′ 24,577″ N	1° 14′ 40,469″ E
108	53° 19′ 41,719″ N	1° 14′ 14,017″ E
109	53° 19′ 36,290″ N	1° 14′ 0,796″ E
110	53° 19′ 26,212″ N	1° 13′ 36,255″ E
111	53° 18′ 53,497″ N	1° 12′ 16,638″ E
112	53° 21′ 15,721″ N	1° 9′ 51,844″ E
113	53° 21′ 16,055″ N	1° 16′ 30,292″ E
114	53° 21′ 9,584″ N	1° 16′ 30,130″ E
115	53° 21′ 9,588″ N	1° 16′ 40,944″ E
116	53° 21′ 9,602″ N	1° 17′ 32,335″ E
117	53° 20′ 46,340″ N	1° 18′ 7,238″ E
118	53° 20′ 58,886″ N	1° 18′ 37,507″ E
119	53° 21′ 16,936″ N	1° 18′ 58,324″ E
120	53° 21′ 22,793″ N	1° 19′ 36,332″ E
121	53° 21′ 24,406″ N	1° 19′ 46,805″ E
122	53° 21′ 30,645″ N	1° 19′ 43,928″ E
123	53° 21′ 30,645″ N	1° 19′ 43,928″ E
124	53° 21′ 31,501″ N	1° 19′ 49,484″ E
125	53° 22′ 5,598″ N	1° 23′ 31,296″ E
126	53° 20′ 55,179″ N	1° 24′ 12,249″ E
127	53° 20′ 5,815″ N	1° 24′ 10,859″ E
128	53° 19′ 37,743″ N	1° 24′ 18,782″ E
129	53° 19′ 12,755″ N	1° 24′ 33,321″ E
130	53° 18′ 37,856″ N	1° 25′ 12,778″ E
131	53° 18′ 20,926″ N	1° 25′ 33,723″ E
132	53° 18′ 2,776″ N	1° 25′ 49,211″ E
133	53° 16′ 55,907″ N	1° 26′ 28,297″ E
134	53° 18′ 28,271″ N	1° 23′ 16,521″ E
135	53° 18′ 28,562″ N	1° 22′ 59,560″ E
136	53° 18′ 10,100″ N	1° 22′ 30,186″ E
137	53° 18′ 5,388″ N	1° 22′ 22,691″ E
138	53° 17′ 37,875″ N	1° 23′ 22,449″ E
139	53° 17′ 6,386″ N	1° 24′ 30,794″ E
140	53° 16′ 34,886″ N	1° 25′ 39,111″ E
141	53° 16′ 3,374″ N	1° 26′ 47,400″ E
142	53° 14′ 19,176″ N	1° 26′ 40,362″ E
143	53° 14′ 41,168″ N	1° 25′ 55,438″ E
144	53° 14′ 12,180″ N	1° 25′ 53,118″ E
145	53° 14′ 9,751″ N	1° 26′ 4,136″ E
146	53° 14′ 8,685″ N	1° 26′ 8,971″ E
147	53° 13′ 50,288″ N	1° 27′ 32,359″ E
148	53° 10′ 37,646″ N	1° 32′ 22,747″ E
149	53° 9′ 2,230″ N	1° 28′ 24,671″ E
150	53° 9′ 12,580″ N	1° 27′ 18,352″ E
151	53° 10′ 2,657″ N	1° 25′ 22,375″ E
152	53° 11′ 16,316″ N	1° 25′ 28,260″ E
153	53° 11′ 45,083″ N	1° 25′ 31,476″ E
154	53° 11′ 44,501″ N	1° 25′ 28,959″ E
155	53° 9′ 25,899″ N	1° 15′ 31,541″ E
156	53° 7′ 47,872″ N	1° 18′ 4,400″ E
157	53° 7′ 18,106″ N	1° 18′ 52,228″ E
158	53° 5′ 11,303″ N	1° 17′ 34,822″ E
159	53° 4′ 57,157″ N	1° 17′ 26,108″ E
160	53° 4′ 41,993″ N	1° 17′ 18,707″ E
161	53° 4′ 16,861″ N	1° 17′ 6,445″ E
162	53° 3′ 31,655″ N	1° 16′ 44,006″ E
163	53° 2′ 56,728″ N	1° 16′ 23,297″ E
164	53° 2′ 36,026″ N	1° 16′ 13,041″ E
165	53° 2′ 11,385″ N	1° 16′ 1,397″ E
166	53° 1′ 56,679″ N	1° 15′ 52,961″ E
167	53° 1′ 53,161″ N	1° 15′ 50,943″ E
168	53° 1′ 46,953″ N	1° 15′ 47,381″ E
169	53° 1′ 37,328″ N	1° 15′ 48,044″ E
170	53° 1′ 15,382″ N	1° 15′ 49,556″ E
171	53° 0′ 55,099″ N	1° 15′ 27,732″ E
172	53° 0′ 38,892″ N	1° 15′ 6,464″ E
173	53° 0′ 24,690″ N	1° 14′ 49,491″ E
174	53° 0′ 7,904″ N	1° 14′ 34,363″ E
175	52° 59′ 51,516″ N	1° 14′ 19,153″ E
176	52° 59′ 30,125″ N	1° 13′ 52,004″ E
177	52° 58′ 15,884″ N	1° 12′ 12,515″ E
178	52° 57′ 19,880″ N	1° 10′ 51,261″ E
179	52° 56′ 53,154″ N	1° 10′ 16,648″ E
180	52° 56′ 52,095″ N	1° 10′ 15,277″ E
181	52° 56′ 52,094″ N	1° 10′ 15,235″ E
182	52° 56′ 52,092″ N	1° 10′ 15,039″ E
183	52° 56′ 52,099″ N	1° 10′ 14,751″ E
184	52° 56′ 52,117″ N	1° 10′ 14,407″ E
185	52° 56′ 52,167″ N	1° 10′ 13,852″ E
186	52° 56′ 52,168″ N	1° 10′ 13,838″ E
187	52° 56′ 52,205″ N	1° 10′ 13,440″ E
188	52° 56′ 52,242″ N	1° 10′ 12,997″ E
189	52° 56′ 52,276″ N	1° 10′ 12,553″ E
190	52° 56′ 52,311″ N	1° 10′ 12,109″ E
191	52° 56′ 52,349″ N	1° 10′ 11,667″ E
192	52° 56′ 52,393″ N	1° 10′ 11,225″ E
193	52° 56′ 52,452″ N	1° 10′ 10,727″ E
194	52° 56′ 52,518″ N	1° 10′ 10,231″ E
195	52° 56′ 52,584″ N	1° 10′ 9,735″ E
196	52° 56′ 52,645″ N	1° 10′ 9,237″ E
197	52° 56′ 52,669″ N	1° 10′ 9,009″ E
198	52° 56′ 52,691″ N	1° 10′ 8,779″ E
199	52° 56′ 52,710″ N	1° 10′ 8,549″ E
200	52° 56′ 52,727″ N	1° 10′ 8,341″ E
201	52° 56′ 52,729″ N	1° 10′ 8,319″ E
202	52° 56′ 52,748″ N	1° 10′ 8,089″ E
203	52° 56′ 52,767″ N	1° 10′ 7,858″ E
204	52° 56′ 52,788″ N	1° 10′ 7,629″ E
205	52° 56′ 52,812″ N	1° 10′ 7,400″ E
206	52° 56′ 52,839″ N	1° 10′ 7,173″ E
207	52° 56′ 52,872″ N	1° 10′ 6,964″ E
208	52° 56′ 52,913″ N	1° 10′ 6,759″ E
209	52° 56′ 52,959″ N	1° 10′ 6,556″ E
210	52° 56′ 53,008″ N	1° 10′ 6,354″ E
211	52° 56′ 53,057″ N	1° 10′ 6,152″ E
212	52° 56′ 53,101″ N	1° 10′ 5,948″ E
213	52° 56′ 53,139″ N	1° 10′ 5,742″ E
214	52° 56′ 53,167″ N	1° 10′ 5,531″ E
215	52° 56′ 53,294″ N	1° 10′ 4,265″ E
216	52° 56′ 53,347″ N	1° 10′ 3,675″ E
217	52° 56′ 53,374″ N	1° 10′ 3,380″ E
218	52° 56′ 53,428″ N	1° 10′ 2,790″ E
219	52° 56′ 53,447″ N	1° 10′ 2,611″ E
220	52° 56′ 53,470″ N	1° 10′ 2,435″ E
221	52° 56′ 53,495″ N	1° 10′ 2,259″ E
222	52° 56′ 53,522″ N	1° 10′ 2,083″ E
223	52° 56′ 53,549″ N	1° 10′ 1,907″ E
224	52° 56′ 53,576″ N	1° 10′ 1,732″ E
225	52° 56′ 53,600″ N	1° 10′ 1,555″ E
226	52° 56′ 53,621″ N	1° 10′ 1,377″ E
227	52° 56′ 53,636″ N	1° 10′ 1,187″ E
228	52° 56′ 53,642″ N	1° 10′ 0,996″ E
229	52° 56′ 53,642″ N	1° 10′ 0,803″ E
230	52° 56′ 53,637″ N	1° 10′ 0,611″ E
231	52° 56′ 53,625″ N	1° 10′ 0,224″ E
232	52° 56′ 53,622″ N	1° 10′ 0,031″ E
233	52° 56′ 53,623″ N	1° 9′ 59,838″ E
234	52° 56′ 53,631″ N	1° 9′ 59,646″ E
235	52° 56′ 53,648″ N	1° 9′ 59,467″ E
236	52° 56′ 53,673″ N	1° 9′ 59,290″ E
237	52° 56′ 53,702″ N	1° 9′ 59,114″ E
238	52° 56′ 53,735″ N	1° 9′ 58,939″ E
239	52° 56′ 53,769″ N	1° 9′ 58,765″ E
240	52° 56′ 53,774″ N	1° 9′ 58,732″ E
241	52° 56′ 53,800″ N	1° 9′ 58,589″ E
242	52° 56′ 53,828″ N	1° 9′ 58,413″ E
243	52° 56′ 53,848″ N	1° 9′ 58,235″ E
244	52° 56′ 53,859″ N	1° 9′ 58,055″ E
245	52° 56′ 53,867″ N	1° 9′ 57,664″ E
246	52° 56′ 53,866″ N	1° 9′ 57,272″ E
247	52° 56′ 53,859″ N	1° 9′ 56,881″ E
248	52° 56′ 53,847″ N	1° 9′ 56,490″ E
249	52° 56′ 53,836″ N	1° 9′ 56,215″ E
250	52° 56′ 53,821″ N	1° 9′ 55,941″ E
251	52° 56′ 53,672″ N	1° 9′ 54,467″ E
252	52° 56′ 53,607″ N	1° 9′ 53,772″ E
253	52° 56′ 53,669″ N	1° 9′ 53,180″ E
254	52° 56′ 53,873″ N	1° 9′ 51,996″ E
255	52° 56′ 53,989″ N	1° 9′ 51,045″ E
256	52° 56′ 54,041″ N	1° 9′ 50,536″ E
257	52° 56′ 54,109″ N	1° 9′ 49,723″ E
258	52° 56′ 54,175″ N	1° 9′ 48,910″ E
259	52° 56′ 54,239″ N	1° 9′ 48,096″ E
260	52° 56′ 54,254″ N	1° 9′ 47,907″ E
261	52° 56′ 54,270″ N	1° 9′ 47,718″ E
262	52° 56′ 54,287″ N	1° 9′ 47,529″ E
263	52° 56′ 54,303″ N	1° 9′ 47,340″ E
264	52° 56′ 54,318″ N	1° 9′ 47,150″ E
265	52° 56′ 54,332″ N	1° 9′ 46,961″ E
266	52° 56′ 54,342″ N	1° 9′ 46,771″ E
267	52° 56′ 54,349″ N	1° 9′ 46,581″ E
268	52° 56′ 54,353″ N	1° 9′ 46,391″ E
269	52° 56′ 54,328″ N	1° 9′ 45,824″ E
270	52° 56′ 54,300″ N	1° 9′ 45,416″ E
271	52° 56′ 54,289″ N	1° 9′ 45,258″ E
272	52° 56′ 54,280″ N	1° 9′ 45,064″ E
273	52° 56′ 54,271″ N	1° 9′ 44,870″ E
274	52° 56′ 54,253″ N	1° 9′ 44,481″ E
275	52° 56′ 54,244″ N	1° 9′ 44,287″ E
276	52° 56′ 54,237″ N	1° 9′ 44,092″ E
277	52° 56′ 54,231″ N	1° 9′ 43,898″ E
278	52° 56′ 54,227″ N	1° 9′ 43,703″ E
279	52° 56′ 54,225″ N	1° 9′ 43,508″ E
280	52° 56′ 54,259″ N	1° 9′ 42,898″ E
281	52° 56′ 54,310″ N	1° 9′ 42,288″ E
282	52° 56′ 54,354″ N	1° 9′ 41,403″ E
283	52° 56′ 54,398″ N	1° 9′ 40,519″ E
284	52° 56′ 54,440″ N	1° 9′ 39,634″ E
285	52° 56′ 54,460″ N	1° 9′ 39,174″ E
286	52° 56′ 54,478″ N	1° 9′ 38,714″ E
287	52° 56′ 54,496″ N	1° 9′ 38,254″ E
288	52° 56′ 54,514″ N	1° 9′ 37,794″ E
289	52° 56′ 54,534″ N	1° 9′ 37,334″ E
290	52° 56′ 54,546″ N	1° 9′ 37,116″ E
291	52° 56′ 54,562″ N	1° 9′ 36,899″ E
292	52° 56′ 54,580″ N	1° 9′ 36,683″ E
293	52° 56′ 54,599″ N	1° 9′ 36,466″ E
294	52° 56′ 54,615″ N	1° 9′ 36,250″ E
295	52° 56′ 54,628″ N	1° 9′ 36,033″ E
296	52° 56′ 54,635″ N	1° 9′ 35,815″ E
297	52° 56′ 54,628″ N	1° 9′ 35,302″ E
298	52° 56′ 54,603″ N	1° 9′ 34,789″ E
299	52° 56′ 54,586″ N	1° 9′ 34,276″ E
300	52° 56′ 54,578″ N	1° 9′ 33,422″ E
301	52° 56′ 54,571″ N	1° 9′ 32,568″ E
302	52° 56′ 54,563″ N	1° 9′ 31,713″ E
303	52° 56′ 54,559″ N	1° 9′ 31,484″ E
304	52° 56′ 54,553″ N	1° 9′ 31,255″ E
305	52° 56′ 54,546″ N	1° 9′ 31,025″ E
306	52° 56′ 54,542″ N	1° 9′ 30,796″ E
307	52° 56′ 54,542″ N	1° 9′ 30,567″ E
308	52° 56′ 54,558″ N	1° 9′ 30,144″ E
309	52° 56′ 54,589″ N	1° 9′ 29,722″ E
310	52° 56′ 54,624″ N	1° 9′ 29,301″ E
311	52° 56′ 54,653″ N	1° 9′ 28,879″ E
312	52° 56′ 54,661″ N	1° 9′ 28,720″ E
313	52° 56′ 54,668″ N	1° 9′ 28,561″ E
314	52° 56′ 54,675″ N	1° 9′ 28,402″ E
315	52° 56′ 54,682″ N	1° 9′ 28,242″ E
316	52° 56′ 54,687″ N	1° 9′ 28,083″ E
317	52° 56′ 54,691″ N	1° 9′ 27,923″ E
318	52° 56′ 54,693″ N	1° 9′ 27,764″ E
319	52° 56′ 54,694″ N	1° 9′ 27,604″ E
320	52° 56′ 54,690″ N	1° 9′ 27,438″ E
321	52° 56′ 54,680″ N	1° 9′ 27,273″ E
322	52° 56′ 54,664″ N	1° 9′ 27,109″ E
323	52° 56′ 54,643″ N	1° 9′ 26,945″ E
324	52° 56′ 54,630″ N	1° 9′ 26,860″ E
325	52° 56′ 54,631″ N	1° 9′ 26,827″ E
326	52° 56′ 54,664″ N	1° 9′ 25,966″ E
327	52° 56′ 54,694″ N	1° 9′ 25,197″ E
328	52° 56′ 54,708″ N	1° 9′ 24,908″ E
329	52° 56′ 54,755″ N	1° 9′ 24,108″ E
330	52° 56′ 54,825″ N	1° 9′ 22,821″ E
331	52° 56′ 54,902″ N	1° 9′ 21,380″ E
332	52° 56′ 54,954″ N	1° 9′ 20,542″ E
333	52° 56′ 54,988″ N	1° 9′ 19,874″ E
334	52° 56′ 55,005″ N	1° 9′ 19,463″ E
335	52° 56′ 55,021″ N	1° 9′ 19,228″ E
336	52° 56′ 55,096″ N	1° 9′ 18,274″ E
337	52° 56′ 55,133″ N	1° 9′ 17,756″ E
338	52° 56′ 55,159″ N	1° 9′ 17,538″ E
339	52° 56′ 55,187″ N	1° 9′ 17,240″ E
340	52° 56′ 55,258″ N	1° 9′ 16,558″ E
341	52° 56′ 55,336″ N	1° 9′ 15,883″ E
342	52° 56′ 55,442″ N	1° 9′ 14,936″ E
343	52° 56′ 55,566″ N	1° 9′ 13,609″ E
344	52° 56′ 55,689″ N	1° 9′ 12,143″ E
345	52° 56′ 55,724″ N	1° 9′ 11,700″ E
346	52° 56′ 55,761″ N	1° 9′ 11,231″ E
347	52° 56′ 55,789″ N	1° 9′ 10,675″ E
348	52° 56′ 55,816″ N	1° 9′ 10,210″ E
349	52° 56′ 55,838″ N	1° 9′ 9,767″ E
350	52° 56′ 55,855″ N	1° 9′ 9,204″ E
351	52° 56′ 55,878″ N	1° 9′ 8,627″ E
352	52° 56′ 55,882″ N	1° 9′ 8,037″ E
353	52° 56′ 55,885″ N	1° 9′ 7,479″ E
354	52° 56′ 55,894″ N	1° 9′ 6,938″ E
355	52° 56′ 55,906″ N	1° 9′ 6,520″ E
356	52° 56′ 55,940″ N	1° 9′ 5,589″ E
357	52° 56′ 55,960″ N	1° 9′ 4,555″ E
358	52° 56′ 55,985″ N	1° 9′ 3,908″ E
359	52° 56′ 56,007″ N	1° 9′ 3,035″ E
360	52° 56′ 56,043″ N	1° 9′ 2,131″ E
361	52° 56′ 56,081″ N	1° 9′ 1,281″ E
362	52° 56′ 56,125″ N	1° 9′ 0,426″ E
363	52° 56′ 56,138″ N	1° 9′ 0,083″ E
364	52° 56′ 56,144″ N	1° 9′ 0,019″ E
365	52° 56′ 56,142″ N	1° 8′ 59,955″ E
366	52° 56′ 56,135″ N	1° 8′ 59,853″ E
367	52° 56′ 56,120″ N	1° 8′ 59,728″ E
368	52° 56′ 56,115″ N	1° 8′ 59,685″ E
369	52° 56′ 56,113″ N	1° 8′ 59,636″ E
370	52° 56′ 56,116″ N	1° 8′ 59,535″ E
371	52° 56′ 56,126″ N	1° 8′ 59,396″ E
372	52° 56′ 56,149″ N	1° 8′ 59,280″ E
373	52° 56′ 56,156″ N	1° 8′ 59,130″ E
374	52° 56′ 56,160″ N	1° 8′ 59,023″ E
375	52° 56′ 56,159″ N	1° 8′ 58,921″ E
376	52° 56′ 56,153″ N	1° 8′ 58,797″ E
377	52° 56′ 56,149″ N	1° 8′ 58,711″ E
378	52° 56′ 56,158″ N	1° 8′ 58,620″ E
379	52° 56′ 56,166″ N	1° 8′ 58,567″ E
380	52° 56′ 56,177″ N	1° 8′ 58,514″ E
381	52° 56′ 56,199″ N	1° 8′ 58,436″ E
382	52° 56′ 56,210″ N	1° 8′ 58,388″ E
383	52° 56′ 56,221″ N	1° 8′ 58,336″ E
384	52° 56′ 56,229″ N	1° 8′ 58,283″ E
385	52° 56′ 56,234″ N	1° 8′ 58,224″ E
386	52° 56′ 56,236″ N	1° 8′ 58,154″ E
387	52° 56′ 56,232″ N	1° 8′ 58,084″ E
388	52° 56′ 56,213″ N	1° 8′ 57,949″ E
389	52° 56′ 56,196″ N	1° 8′ 57,851″ E
390	52° 56′ 56,191″ N	1° 8′ 57,792″ E
391	52° 56′ 56,190″ N	1° 8′ 57,727″ E
392	52° 56′ 56,192″ N	1° 8′ 57,652″ E
393	52° 56′ 56,200″ N	1° 8′ 57,578″ E
394	52° 56′ 56,212″ N	1° 8′ 57,482″ E
395	52° 56′ 56,230″ N	1° 8′ 57,392″ E
396	52° 56′ 56,244″ N	1° 8′ 57,351″ E
397	52° 56′ 56,255″ N	1° 8′ 57,303″ E
398	52° 56′ 56,267″ N	1° 8′ 57,218″ E
399	52° 56′ 56,273″ N	1° 8′ 57,122″ E
400	52° 56′ 56,271″ N	1° 8′ 56,950″ E
401	52° 56′ 56,256″ N	1° 8′ 56,751″ E
402	52° 56′ 56,247″ N	1° 8′ 56,601″ E
403	52° 56′ 56,242″ N	1° 8′ 56,536″ E
404	52° 56′ 56,244″ N	1° 8′ 56,472″ E
405	52° 56′ 56,260″ N	1° 8′ 56,361″ E
406	52° 56′ 56,274″ N	1° 8′ 56,303″ E
407	52° 56′ 56,285″ N	1° 8′ 56,239″ E
408	52° 56′ 56,307″ N	1° 8′ 56,021″ E
409	52° 56′ 56,320″ N	1° 8′ 55,647″ E
410	52° 56′ 56,327″ N	1° 8′ 55,080″ E
411	52° 56′ 56,337″ N	1° 8′ 54,834″ E
412	52° 56′ 56,357″ N	1° 8′ 54,434″ E
413	52° 56′ 56,378″ N	1° 8′ 53,980″ E
414	52° 56′ 56,405″ N	1° 8′ 53,527″ E
415	52° 56′ 56,442″ N	1° 8′ 52,977″ E
416	52° 56′ 56,474″ N	1° 8′ 52,583″ E
417	52° 56′ 56,485″ N	1° 8′ 52,402″ E
418	52° 56′ 56,493″ N	1° 8′ 52,215″ E
419	52° 56′ 56,496″ N	1° 8′ 52,018″ E
420	52° 56′ 56,571″ N	1° 8′ 50,912″ E
421	52° 56′ 56,607″ N	1° 8′ 50,422″ E
422	52° 56′ 56,644″ N	1° 8′ 49,931″ E
423	52° 56′ 56,682″ N	1° 8′ 49,441″ E
424	52° 56′ 56,719″ N	1° 8′ 48,951″ E
425	52° 56′ 56,755″ N	1° 8′ 48,460″ E
426	52° 56′ 56,778″ N	1° 8′ 48,023″ E
427	52° 56′ 56,793″ N	1° 8′ 47,584″ E
428	52° 56′ 56,804″ N	1° 8′ 47,144″ E
429	52° 56′ 56,821″ N	1° 8′ 46,705″ E
430	52° 56′ 56,849″ N	1° 8′ 46,269″ E
431	52° 56′ 57,031″ N	1° 8′ 44,094″ E
432	52° 56′ 57,143″ N	1° 8′ 42,757″ E
433	52° 56′ 57,183″ N	1° 8′ 42,274″ E
434	52° 56′ 57,208″ N	1° 8′ 42,038″ E
435	52° 56′ 57,216″ N	1° 8′ 41,942″ E
436	52° 56′ 57,222″ N	1° 8′ 41,846″ E
437	52° 56′ 57,222″ N	1° 8′ 41,826″ E
438	52° 56′ 57,242″ N	1° 8′ 41,608″ E
439	52° 56′ 57,243″ N	1° 8′ 41,601″ E
440	52° 56′ 57,276″ N	1° 8′ 41,405″ E
441	52° 56′ 57,304″ N	1° 8′ 41,209″ E
442	52° 56′ 57,335″ N	1° 8′ 40,949″ E
443	52° 56′ 57,367″ N	1° 8′ 40,652″ E
444	52° 56′ 57,390″ N	1° 8′ 40,348″ E
445	52° 56′ 57,409″ N	1° 8′ 40,076″ E
446	52° 56′ 57,426″ N	1° 8′ 39,917″ E
447	52° 56′ 57,434″ N	1° 8′ 39,811″ E
448	52° 56′ 57,442″ N	1° 8′ 39,576″ E
449	52° 56′ 57,443″ N	1° 8′ 39,487″ E
450	52° 56′ 57,471″ N	1° 8′ 39,155″ E
451	52° 56′ 57,517″ N	1° 8′ 38,578″ E
452	52° 56′ 57,560″ N	1° 8′ 37,999″ E
453	52° 56′ 57,601″ N	1° 8′ 37,421″ E
454	52° 56′ 57,628″ N	1° 8′ 36,995″ E
455	52° 56′ 57,651″ N	1° 8′ 36,569″ E
456	52° 56′ 57,673″ N	1° 8′ 36,143″ E
457	52° 56′ 57,696″ N	1° 8′ 35,716″ E
458	52° 56′ 57,723″ N	1° 8′ 35,291″ E
459	52° 56′ 57,756″ N	1° 8′ 34,877″ E
460	52° 56′ 57,791″ N	1° 8′ 34,520″ E
461	52° 56′ 57,805″ N	1° 8′ 34,405″ E
462	52° 56′ 57,833″ N	1° 8′ 34,187″ E
463	52° 56′ 57,854″ N	1° 8′ 33,996″ E
464	52° 56′ 57,876″ N	1° 8′ 33,767″ E
465	52° 56′ 57,909″ N	1° 8′ 33,475″ E
466	52° 56′ 57,937″ N	1° 8′ 33,262″ E
467	52° 56′ 57,958″ N	1° 8′ 33,060″ E
468	52° 56′ 57,974″ N	1° 8′ 32,825″ E
469	52° 56′ 57,988″ N	1° 8′ 32,547″ E
470	52° 56′ 57,996″ N	1° 8′ 32,371″ E
471	52° 56′ 58,009″ N	1° 8′ 32,099″ E
472	52° 56′ 58,026″ N	1° 8′ 31,698″ E
473	52° 56′ 58,053″ N	1° 8′ 31,164″ E
474	52° 56′ 58,091″ N	1° 8′ 30,706″ E
475	52° 56′ 58,128″ N	1° 8′ 30,178″ E
476	52° 56′ 58,173″ N	1° 8′ 29,592″ E
477	52° 56′ 58,219″ N	1° 8′ 29,048″ E
478	52° 56′ 58,278″ N	1° 8′ 28,431″ E
479	52° 56′ 58,343″ N	1° 8′ 27,669″ E
480	52° 56′ 58,359″ N	1° 8′ 27,381″ E
481	52° 56′ 58,372″ N	1° 8′ 27,216″ E
482	52° 56′ 58,390″ N	1° 8′ 26,964″ E
483	52° 56′ 58,392″ N	1° 8′ 26,912″ E
484	52° 56′ 58,399″ N	1° 8′ 26,837″ E
485	52° 56′ 58,403″ N	1° 8′ 26,797″ E
486	52° 56′ 58,398″ N	1° 8′ 26,780″ E
487	52° 56′ 57,591″ N	1° 8′ 23,453″ E
488	52° 56′ 57,607″ N	1° 8′ 23,312″ E
489	52° 56′ 57,696″ N	1° 8′ 22,616″ E
490	52° 56′ 57,736″ N	1° 8′ 22,254″ E
491	52° 56′ 57,819″ N	1° 8′ 21,510″ E
492	52° 56′ 58,021″ N	1° 8′ 19,543″ E
493	52° 56′ 58,154″ N	1° 8′ 18,288″ E
494	52° 56′ 58,156″ N	1° 8′ 18,267″ E
495	52° 56′ 58,293″ N	1° 8′ 16,991″ E
496	52° 56′ 58,371″ N	1° 8′ 16,290″ E
497	52° 56′ 58,452″ N	1° 8′ 15,590″ E
498	52° 56′ 58,533″ N	1° 8′ 14,889″ E
499	52° 56′ 58,611″ N	1° 8′ 14,188″ E
500	52° 56′ 58,684″ N	1° 8′ 13,438″ E
501	52° 56′ 58,747″ N	1° 8′ 12,686″ E
502	52° 56′ 58,808″ N	1° 8′ 11,957″ E
503	52° 56′ 59,726″ N	1° 8′ 12,960″ E
504	52° 57′ 0,102″ N	1° 8′ 13,371″ E
505	53° 10′ 25,477″ N	1° 14′ 43,972″ E
506	53° 12′ 29,925″ N	1° 23′ 41,529″ E
507	53° 13′ 37,575″ N	1° 21′ 15,819″ E
508	53° 13′ 38,222″ N	1° 21′ 13,292″ E
509	53° 13′ 39,087″ N	1° 21′ 10,499″ E
510	53° 13′ 39,861″ N	1° 21′ 8,335″ E
511	53° 13′ 40,479″ N	1° 21′ 6,766″ E
512	53° 13′ 41,191″ N	1° 21′ 5,076″ E
513	53° 15′ 1,825″ N	1° 18′ 14,021″ E
514	53° 15′ 1,855″ N	1° 18′ 13,955″ E
515	53° 15′ 1,962″ N	1° 18′ 13,727″ E
516	53° 15′ 2,070″ N	1° 18′ 13,499″ E
517	53° 15′ 2,163″ N	1° 18′ 13,302″ E
518	53° 15′ 2,202″ N	1° 18′ 13,221″ E
519	53° 15′ 2,292″ N	1° 18′ 13,034″ E
520	53° 15′ 2,400″ N	1° 18′ 12,808″ E
521	53° 15′ 2,511″ N	1° 18′ 12,580″ E
522	53° 15′ 2,622″ N	1° 18′ 12,353″ E
523	53° 15′ 2,733″ N	1° 18′ 12,126″ E
524	53° 15′ 2,845″ N	1° 18′ 11,900″ E
525	53° 15′ 2,958″ N	1° 18′ 11,675″ E
526	53° 15′ 3,071″ N	1° 18′ 11,450″ E
527	53° 15′ 3,185″ N	1° 18′ 11,226″ E
528	53° 15′ 3,298″ N	1° 18′ 11,003″ E
529	53° 15′ 3,413″ N	1° 18′ 10,780″ E
530	53° 15′ 3,528″ N	1° 18′ 10,557″ E
531	53° 15′ 3,643″ N	1° 18′ 10,336″ E
532	53° 15′ 3,759″ N	1° 18′ 10,115″ E
533	53° 15′ 3,875″ N	1° 18′ 9,895″ E
534	53° 15′ 3,992″ N	1° 18′ 9,676″ E
535	53° 15′ 4,109″ N	1° 18′ 9,458″ E
536	53° 15′ 4,227″ N	1° 18′ 9,240″ E
537	53° 15′ 4,345″ N	1° 18′ 9,022″ E
538	53° 15′ 4,462″ N	1° 18′ 8,808″ E
539	53° 15′ 4,562″ N	1° 18′ 8,627″ E
540	53° 15′ 4,605″ N	1° 18′ 8,549″ E
541	53° 15′ 4,703″ N	1° 18′ 8,372″ E
542	53° 15′ 4,822″ N	1° 18′ 8,160″ E
543	53° 15′ 4,942″ N	1° 18′ 7,946″ E
544	53° 15′ 5,063″ N	1° 18′ 7,733″ E
545	53° 15′ 5,184″ N	1° 18′ 7,521″ E
546	53° 15′ 5,306″ N	1° 18′ 7,309″ E
547	53° 15′ 5,428″ N	1° 18′ 7,098″ E
548	53° 15′ 5,551″ N	1° 18′ 6,888″ E
549	53° 15′ 5,674″ N	1° 18′ 6,678″ E
550	53° 15′ 5,797″ N	1° 18′ 6,469″ E
551	53° 15′ 5,921″ N	1° 18′ 6,262″ E
552	53° 15′ 6,046″ N	1° 18′ 6,054″ E
553	53° 15′ 6,170″ N	1° 18′ 5,847″ E
554	53° 15′ 6,296″ N	1° 18′ 5,641″ E
555	53° 15′ 6,421″ N	1° 18′ 5,436″ E
556	53° 15′ 6,547″ N	1° 18′ 5,232″ E
557	53° 15′ 6,674″ N	1° 18′ 5,028″ E
558	53° 15′ 6,801″ N	1° 18′ 4,825″ E
559	53° 15′ 6,926″ N	1° 18′ 4,626″ E
560	53° 15′ 7,032″ N	1° 18′ 4,458″ E
561	53° 15′ 7,078″ N	1° 18′ 4,387″ E
562	53° 15′ 7,186″ N	1° 18′ 4,218″ E
563	53° 15′ 7,313″ N	1° 18′ 4,021″ E
564	53° 15′ 7,442″ N	1° 18′ 3,821″ E
565	53° 15′ 7,571″ N	1° 18′ 3,623″ E
566	53° 15′ 7,701″ N	1° 18′ 3,425″ E
567	53° 15′ 7,832″ N	1° 18′ 3,228″ E
568	53° 15′ 7,962″ N	1° 18′ 3,032″ E
569	53° 15′ 8,094″ N	1° 18′ 2,836″ E
570	53° 15′ 8,225″ N	1° 18′ 2,642″ E
571	53° 15′ 8,357″ N	1° 18′ 2,448″ E
572	53° 15′ 8,489″ N	1° 18′ 2,255″ E
573	53° 15′ 8,622″ N	1° 18′ 2,063″ E
574	53° 15′ 8,755″ N	1° 18′ 1,871″ E
575	53° 15′ 8,889″ N	1° 18′ 1,680″ E
576	53° 15′ 9,023″ N	1° 18′ 1,491″ E
577	53° 15′ 9,157″ N	1° 18′ 1,301″ E
578	53° 15′ 9,292″ N	1° 18′ 1,112″ E
579	53° 15′ 9,427″ N	1° 18′ 0,925″ E
580	53° 15′ 9,562″ N	1° 18′ 0,738″ E
581	53° 15′ 9,697″ N	1° 18′ 0,555″ E
582	53° 15′ 9,808″ N	1° 18′ 0,403″ E
583	53° 15′ 9,856″ N	1° 18′ 0,339″ E
584	53° 15′ 9,973″ N	1° 18′ 0,180″ E
585	53° 15′ 10,108″ N	1° 18′ 0,000″ E
586	53° 15′ 10,246″ N	1° 17′ 59,816″ E
587	53° 15′ 10,384″ N	1° 17′ 59,634″ E
588	53° 15′ 10,522″ N	1° 17′ 59,453″ E
589	53° 15′ 10,661″ N	1° 17′ 59,272″ E
590	53° 15′ 10,800″ N	1° 17′ 59,093″ E
591	53° 15′ 10,940″ N	1° 17′ 58,914″ E
592	53° 15′ 11,079″ N	1° 17′ 58,736″ E
593	53° 15′ 11,219″ N	1° 17′ 58,559″ E
594	53° 15′ 11,360″ N	1° 17′ 58,382″ E
595	53° 15′ 11,501″ N	1° 17′ 58,206″ E
596	53° 15′ 11,642″ N	1° 17′ 58,032″ E
597	53° 15′ 11,784″ N	1° 17′ 57,858″ E
598	53° 15′ 11,926″ N	1° 17′ 57,685″ E
599	53° 15′ 12,068″ N	1° 17′ 57,513″ E
600	53° 15′ 12,211″ N	1° 17′ 57,341″ E
601	53° 15′ 12,354″ N	1° 17′ 57,171″ E
602	53° 15′ 12,497″ N	1° 17′ 57,001″ E
603	53° 15′ 12,641″ N	1° 17′ 56,832″ E
604	53° 15′ 12,785″ N	1° 17′ 56,664″ E
605	53° 15′ 12,930″ N	1° 17′ 56,497″ E
606	53° 15′ 13,075″ N	1° 17′ 56,331″ E
607	53° 15′ 13,220″ N	1° 17′ 56,165″ E
608	53° 15′ 13,365″ N	1° 17′ 56,000″ E
609	53° 15′ 13,511″ N	1° 17′ 55,837″ E
610	53° 15′ 13,657″ N	1° 17′ 55,674″ E
611	53° 15′ 13,804″ N	1° 17′ 55,512″ E
612	53° 15′ 13,951″ N	1° 17′ 55,351″ E
613	53° 15′ 14,098″ N	1° 17′ 55,190″ E
614	53° 15′ 14,246″ N	1° 17′ 55,030″ E
615	53° 15′ 14,394″ N	1° 17′ 54,872″ E
616	53° 15′ 14,542″ N	1° 17′ 54,714″ E
617	53° 15′ 14,691″ N	1° 17′ 54,557″ E
618	53° 15′ 14,839″ N	1° 17′ 54,401″ E
619	53° 15′ 14,989″ N	1° 17′ 54,246″ E
620	53° 15′ 15,138″ N	1° 17′ 54,092″ E
621	53° 15′ 15,288″ N	1° 17′ 53,938″ E
622	53° 15′ 15,438″ N	1° 17′ 53,786″ E
623	53° 15′ 15,589″ N	1° 17′ 53,634″ E
624	53° 15′ 15,738″ N	1° 17′ 53,485″ E
625	53° 15′ 15,868″ N	1° 17′ 53,356″ E
626	53° 15′ 15,920″ N	1° 17′ 53,304″ E
627	53° 15′ 16,045″ N	1° 17′ 53,182″ E
628	53° 15′ 16,194″ N	1° 17′ 53,036″ E
629	53° 15′ 16,346″ N	1° 17′ 52,889″ E
630	53° 15′ 16,499″ N	1° 17′ 52,743″ E
631	53° 15′ 16,652″ N	1° 17′ 52,597″ E
632	53° 15′ 16,804″ N	1° 17′ 52,453″ E
633	53° 15′ 16,958″ N	1° 17′ 52,309″ E
634	53° 15′ 17,111″ N	1° 17′ 52,166″ E
635	53° 15′ 17,265″ N	1° 17′ 52,024″ E
636	53° 15′ 17,419″ N	1° 17′ 51,883″ E
637	53° 15′ 17,574″ N	1° 17′ 51,743″ E
638	53° 15′ 17,729″ N	1° 17′ 51,604″ E
639	53° 15′ 17,884″ N	1° 17′ 51,466″ E
640	53° 15′ 18,039″ N	1° 17′ 51,328″ E
641	53° 15′ 18,195″ N	1° 17′ 51,192″ E
642	53° 15′ 18,351″ N	1° 17′ 51,057″ E
643	53° 15′ 18,507″ N	1° 17′ 50,922″ E
644	53° 15′ 18,664″ N	1° 17′ 50,788″ E
645	53° 15′ 18,821″ N	1° 17′ 50,655″ E
646	53° 15′ 18,976″ N	1° 17′ 50,525″ E
647	53° 15′ 19,109″ N	1° 17′ 50,414″ E
648	53° 15′ 19,165″ N	1° 17′ 50,368″ E
649	53° 15′ 19,295″ N	1° 17′ 50,261″ E
650	53° 15′ 19,451″ N	1° 17′ 50,133″ E
651	53° 15′ 19,609″ N	1° 17′ 50,005″ E
652	53° 15′ 19,767″ N	1° 17′ 49,878″ E
653	53° 15′ 19,926″ N	1° 17′ 49,752″ E
654	53° 15′ 20,085″ N	1° 17′ 49,626″ E
655	53° 15′ 20,244″ N	1° 17′ 49,502″ E
656	53° 15′ 20,404″ N	1° 17′ 49,378″ E
657	53° 15′ 20,564″ N	1° 17′ 49,256″ E
658	53° 15′ 20,724″ N	1° 17′ 49,134″ E
659	53° 15′ 20,884″ N	1° 17′ 49,013″ E
660	53° 15′ 21,045″ N	1° 17′ 48,893″ E
661	53° 15′ 21,205″ N	1° 17′ 48,775″ E
662	53° 15′ 21,366″ N	1° 17′ 48,657″ E
663	53° 15′ 21,528″ N	1° 17′ 48,539″ E
664	53° 15′ 21,689″ N	1° 17′ 48,424″ E
665	53° 15′ 21,851″ N	1° 17′ 48,308″ E
666	53° 15′ 22,013″ N	1° 17′ 48,194″ E
667	53° 15′ 22,175″ N	1° 17′ 48,081″ E
668	53° 15′ 22,336″ N	1° 17′ 47,970″ E
669	53° 15′ 22,470″ N	1° 17′ 47,878″ E
670	53° 15′ 22,530″ N	1° 17′ 47,838″ E
671	53° 15′ 22,666″ N	1° 17′ 47,746″ E
672	53° 15′ 22,827″ N	1° 17′ 47,638″ E
673	53° 15′ 22,990″ N	1° 17′ 47,530″ E
674	53° 15′ 23,153″ N	1° 17′ 47,422″ E
675	53° 15′ 23,317″ N	1° 17′ 47,315″ E
676	53° 15′ 23,481″ N	1° 17′ 47,210″ E
677	53° 15′ 23,646″ N	1° 17′ 47,105″ E
678	53° 15′ 23,810″ N	1° 17′ 47,002″ E
679	53° 15′ 23,975″ N	1° 17′ 46,899″ E
680	53° 15′ 24,140″ N	1° 17′ 46,797″ E
681	53° 15′ 24,305″ N	1° 17′ 46,696″ E
682	53° 15′ 24,471″ N	1° 17′ 46,597″ E
683	53° 15′ 24,636″ N	1° 17′ 46,498″ E
684	53° 15′ 24,802″ N	1° 17′ 46,400″ E
685	53° 15′ 24,968″ N	1° 17′ 46,303″ E
686	53° 15′ 25,135″ N	1° 17′ 46,207″ E
687	53° 15′ 25,300″ N	1° 17′ 46,112″ E
688	53° 15′ 25,467″ N	1° 17′ 46,019″ E
689	53° 15′ 25,632″ N	1° 17′ 45,926″ E
690	53° 15′ 25,770″ N	1° 17′ 45,851″ E
691	53° 15′ 25,829″ N	1° 17′ 45,818″ E
692	53° 15′ 25,970″ N	1° 17′ 45,741″ E
693	53° 15′ 26,136″ N	1° 17′ 45,652″ E
694	53° 15′ 26,303″ N	1° 17′ 45,563″ E
695	53° 15′ 26,471″ N	1° 17′ 45,475″ E
696	53° 15′ 26,639″ N	1° 17′ 45,388″ E
697	53° 15′ 26,807″ N	1° 17′ 45,302″ E
698	53° 15′ 26,975″ N	1° 17′ 45,217″ E
699	53° 15′ 27,144″ N	1° 17′ 45,133″ E
700	53° 15′ 27,312″ N	1° 17′ 45,049″ E
701	53° 15′ 27,481″ N	1° 17′ 44,967″ E
702	53° 15′ 27,650″ N	1° 17′ 44,886″ E
703	53° 15′ 27,819″ N	1° 17′ 44,806″ E
704	53° 15′ 27,989″ N	1° 17′ 44,726″ E
705	53° 15′ 28,158″ N	1° 17′ 44,648″ E
706	53° 15′ 28,328″ N	1° 17′ 44,571″ E
707	53° 15′ 28,498″ N	1° 17′ 44,495″ E
708	53° 15′ 28,668″ N	1° 17′ 44,420″ E
709	53° 15′ 28,838″ N	1° 17′ 44,345″ E
710	53° 15′ 29,008″ N	1° 17′ 44,272″ E
711	53° 15′ 29,177″ N	1° 17′ 44,201″ E
712	53° 15′ 29,315″ N	1° 17′ 44,143″ E
713	53° 15′ 29,374″ N	1° 17′ 44,118″ E
714	53° 15′ 29,522″ N	1° 17′ 44,057″ E
715	53° 15′ 29,691″ N	1° 17′ 43,989″ E
716	53° 15′ 29,862″ N	1° 17′ 43,921″ E
717	53° 15′ 30,033″ N	1° 17′ 43,853″ E
718	53° 15′ 30,204″ N	1° 17′ 43,787″ E
719	53° 15′ 30,376″ N	1° 17′ 43,722″ E
720	53° 15′ 30,548″ N	1° 17′ 43,658″ E
721	53° 15′ 30,719″ N	1° 17′ 43,594″ E
722	53° 15′ 30,892″ N	1° 17′ 43,532″ E
723	53° 15′ 31,063″ N	1° 17′ 43,471″ E
724	53° 15′ 31,235″ N	1° 17′ 43,411″ E
725	53° 15′ 31,408″ N	1° 17′ 43,351″ E
726	53° 15′ 31,580″ N	1° 17′ 43,293″ E
727	53° 15′ 31,752″ N	1° 17′ 43,236″ E
728	53° 15′ 31,925″ N	1° 17′ 43,180″ E
729	53° 15′ 32,098″ N	1° 17′ 43,124″ E
730	53° 15′ 32,270″ N	1° 17′ 43,070″ E
731	53° 15′ 32,444″ N	1° 17′ 43,017″ E
732	53° 15′ 32,617″ N	1° 17′ 42,965″ E
733	53° 15′ 32,789″ N	1° 17′ 42,914″ E
734	53° 15′ 32,963″ N	1° 17′ 42,864″ E
735	53° 15′ 33,137″ N	1° 17′ 42,814″ E
736	53° 15′ 33,310″ N	1° 17′ 42,766″ E
737	53° 15′ 33,484″ N	1° 17′ 42,719″ E
738	53° 15′ 33,657″ N	1° 17′ 42,673″ E
739	53° 15′ 33,831″ N	1° 17′ 42,628″ E
740	53° 15′ 34,005″ N	1° 17′ 42,584″ E
741	53° 15′ 34,179″ N	1° 17′ 42,541″ E
742	53° 15′ 34,353″ N	1° 17′ 42,499″ E
743	53° 15′ 34,527″ N	1° 17′ 42,458″ E
744	53° 15′ 34,701″ N	1° 17′ 42,418″ E
745	53° 15′ 34,876″ N	1° 17′ 42,379″ E
746	53° 15′ 35,050″ N	1° 17′ 42,341″ E
747	53° 15′ 35,225″ N	1° 17′ 42,304″ E
748	53° 15′ 35,399″ N	1° 17′ 42,268″ E
749	53° 15′ 35,574″ N	1° 17′ 42,233″ E
750	53° 15′ 35,749″ N	1° 17′ 42,199″ E
751	53° 15′ 35,923″ N	1° 17′ 42,167″ E
752	53° 15′ 36,098″ N	1° 17′ 42,135″ E
753	53° 15′ 36,273″ N	1° 17′ 42,104″ E
754	53° 15′ 36,446″ N	1° 17′ 42,074″ E
755	53° 15′ 36,597″ N	1° 17′ 42,050″ E
756	53° 15′ 36,656″ N	1° 17′ 42,040″ E
757	53° 15′ 36,801″ N	1° 17′ 42,017″ E
758	53° 15′ 36,974″ N	1° 17′ 41,991″ E
759	53° 15′ 37,148″ N	1° 17′ 41,965″ E
760	53° 15′ 37,323″ N	1° 17′ 41,941″ E
761	53° 15′ 37,499″ N	1° 17′ 41,917″ E
762	53° 15′ 37,675″ N	1° 17′ 41,894″ E
763	53° 15′ 37,850″ N	1° 17′ 41,873″ E
764	53° 15′ 38,025″ N	1° 17′ 41,852″ E
765	53° 15′ 38,201″ N	1° 17′ 41,833″ E
766	53° 15′ 38,376″ N	1° 17′ 41,814″ E
767	53° 15′ 38,552″ N	1° 17′ 41,797″ E
768	53° 15′ 38,728″ N	1° 17′ 41,780″ E
769	53° 15′ 38,903″ N	1° 17′ 41,765″ E
770	53° 15′ 39,078″ N	1° 17′ 41,751″ E
771	53° 15′ 39,254″ N	1° 17′ 41,737″ E
772	53° 15′ 39,430″ N	1° 17′ 41,725″ E
773	53° 15′ 39,606″ N	1° 17′ 41,714″ E
774	53° 15′ 39,782″ N	1° 17′ 41,703″ E
775	53° 15′ 39,957″ N	1° 17′ 41,694″ E
776	53° 15′ 40,131″ N	1° 17′ 41,686″ E
777	53° 15′ 40,281″ N	1° 17′ 41,680″ E
778	53° 15′ 40,344″ N	1° 17′ 41,677″ E
779	53° 15′ 40,487″ N	1° 17′ 41,672″ E
780	53° 15′ 40,660″ N	1° 17′ 41,667″ E
781	53° 15′ 40,837″ N	1° 17′ 41,663″ E
782	53° 15′ 41,013″ N	1° 17′ 41,660″ E
783	53° 15′ 41,188″ N	1° 17′ 41,658″ E
784	53° 15′ 41,364″ N	1° 17′ 41,657″ E
785	53° 15′ 41,540″ N	1° 17′ 41,657″ E
786	53° 15′ 41,716″ N	1° 17′ 41,658″ E
787	53° 15′ 41,892″ N	1° 17′ 41,660″ E
788	53° 15′ 42,068″ N	1° 17′ 41,663″ E
789	53° 15′ 42,244″ N	1° 17′ 41,667″ E
790	53° 15′ 42,420″ N	1° 17′ 41,673″ E
791	53° 15′ 42,595″ N	1° 17′ 41,679″ E
792	53° 15′ 42,771″ N	1° 17′ 41,686″ E
793	53° 15′ 42,947″ N	1° 17′ 41,694″ E
794	53° 15′ 43,123″ N	1° 17′ 41,703″ E
795	53° 15′ 43,298″ N	1° 17′ 41,714″ E
796	53° 15′ 43,474″ N	1° 17′ 41,725″ E
797	53° 15′ 43,648″ N	1° 17′ 41,737″ E
798	53° 15′ 43,798″ N	1° 17′ 41,749″ E
799	53° 17′ 24,066″ N	1° 17′ 49,680″ E
800	53° 17′ 49,561″ N	1° 17′ 29,006″ E
801	53° 18′ 9,032″ N	1° 17′ 13,212″ E
802	53° 18′ 47,802″ N	1° 16′ 53,972″ E
803	53° 18′ 47,894″ N	1° 16′ 53,926″ E
804	53° 18′ 47,772″ N	1° 16′ 53,803″ E
805	53° 10′ 41,118″ N	1° 14′ 20,621″ E