SCHEDULES

SCHEDULE 11 PROTECTIVE PROVISIONS

PART 1 FOR THE PROTECTION OF ELECTRICITY, GAS, WATER AND SEWERAGE UNDERTAKERS

5 Protective works to buildings
The undertaker, in the case of the powers conferred by article 25 (protective work to buildings), must exercise those powers so as not to obstruct or render less convenient the access to any apparatus.