SCHEDULES

SCHEDULE 10 FOR THE PROTECTION OF ELECTRICITY, GAS, WATER AND SEWAGE UNDERTAKERS

PART 4 FOR THE PROTECTION OF NATIONAL GAS TRANSMISSION PLC AS GAS UNDERTAKER

Protective works to buildings
27. The undertaker must exercise the powers conferred by article 25 (protective work to buildings) so as not to obstruct or render less convenient the access to any apparatus without the written consent of National Gas (such consent not to be unreasonably withheld).