SCHEDULE 15 PROTECTIVE PROVISIONS

PART 3 FOR THE PROTECTION OF NATIONAL GAS TRANSMISSION PLC AS GAS UNDERTAKER

Co-operation
29. (1) Where in consequence of the proposed construction of any part of the authorised works, the undertaker or National Gas requires the removal of apparatus under paragraph 23(2) or National Gas makes requirements for the protection or alteration of apparatus under paragraph 25, the undertaker must use its best endeavours to co-ordinate the execution of the works in the interests of safety and the efficient and economic execution of the authorised works and taking into account the need to ensure the safe and efficient operation of National Gas’s undertaking and National Gas must use its best endeavours to co-operate with the undertaker for that purpose.
(2) For the avoidance of doubt whenever National Gas’s consent, agreement or approval is required in relation to plans, documents or other information submitted by the undertaker or the taking of action by the undertaker, it must not be unreasonably withheld or delayed.