PART VI REPORTS

13 Reports
1 Following the conclusion of an examination undertaken pursuant to Part III of these regulations, the Commissioner shall make a report .
2 Following the conclusion of a functions review, an arrangements review, monitoring pursuant to section 73(1) of the Act or an assessment pursuant to section 73(1A) of the Act, the Commissioner may make a report.
3 A report made under paragraph (1) or (2) shall set out—
(a) the findings and conclusions of the Commissioner; and
(b) any recommendations made by the Commissioner.
4 The Commissioner shall send a copy of such a report to—
(a) The First Minister; and
(b) The libraries of the Assembly and of the Houses of Parliament.
5 The Commissioner shall send a copy
(a) in the case of a report made under paragraph (1), to the child or person , as the case may be, who made a representation to the Commissioner in accordance with regulation 6; and
(b) in the case of a report made under paragraph (1) or (2), to the person or persons
(i) whose provision of services or the exercise of whose functions have been examined,
(ii) whose arrangements in relation to complaints, whistle-blowing or advocacy have been reviewed or monitored,
(iii) in respect of whom an assessment pursuant to section 73(1A) of the Act has been carried out, or
(iv) who are mentioned in the report.