1 Citation, commencement and application
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Regulations revoked (3.5.2006) by The Transmissible Spongiform Encephalopathies (Wales) Regulations 2006 (S.I. 2006/1226), reg. 1, Sch. 8

2 Revocation of the Specified Risk Material (Amendment) (Wales) Regulations 2001
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3 Amendment of the Specified Risk Material Order 1997
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4 Amendments to the Specified Risk Material Regulations 1997
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .