SCHEDULE 4 LICENSED SEED TESTING STATIONS

PART II LSTS licence conditions
10 The reserve portion shall be placed in a bag and the bag shall be identified, sealed and retained under good storage conditions in accordance with instructions issued by the National Assembly. It shall not be opened during the period specified in the instruction except by or on the authority of an authorised officer.