SCHEDULE 3 Additional conditions that apply to the keeping of laying hens in conventional cages
2 Cage systems must have at least 550 cm2 per hen of cage area, measured in a horizontal plane, which may be used without restriction, in particular not including non-waste deflection plates liable to restrict the area available unless they are placed so as not to restrict the area available for the hens to use.