SCHEDULE CLASSES OF FIREPLACE WHICH ARE EXEMPT
2 No fuel is to be used other than wood pellets with a diameter of 6mm and a maximum length of 30mm but excluding any such wood pellets which contain halogenated organic compounds or heavy metals as a result of treatment with wood-preservatives or coatings.