Welsh Statutory Instruments
2010 No. 66 (W.16)
WATER, WALES
The Private Water Supplies (Wales) Regulations 2010 (revoked)
Regulations revoked (20.11.2017) by The Private Water Supplies (Wales) Regulations 2017 (S.I. 2017/1041), regs. 1, 24(1)(a) (with regs. 3, 26(1)-(3))
Made 13 January 2010
Laid before the National Assembly for Wales 14 January 2010
Coming into force 4 February 2010

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 1 Water standards

Title, application and commencement
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Scope
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Exemptions
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Wholesomeness
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Disinfection
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Requirement to carry out a risk assessment
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 Monitoring

Monitoring
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Further distribution of supplies from water undertakers or water supply licensees
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Large supplies and supplies to commercial or public premises
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Other private supplies
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Monitoring of radioactive substances: general
10A. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Monitoring of radioactive substances: supplies to a single dwelling not used for a commercial or public activity
10B. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Sampling and analysis
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Maintenance of records
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Notification of information
13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 3 Action in the event of failure

Provision of information
14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Investigation
15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Procedure following investigation
16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Authorisations of different standards
17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 4 Notice procedure

Notices
18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appeals
19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Penalties
20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 5 Miscellaneous

Fees
21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Revocation
22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 1 Concentrations or Values
Regulations 4, 10, 15 and 17

PART 1 Wholesomeness
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 Indicator Parameters
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 3 Radioactive substances parameters
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2 Monitoring
Regulation 9

PART 1 Check monitoring

Sampling
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Frequency of sampling
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 Audit monitoring

Sampling
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Frequency of sampling
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 3 Minimum frequency for both check monitoring and audit monitoring for water put into bottles or containers
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 2A Monitoring of radioactive substances
Regulation 10A

Radon
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Tritium
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Indicative Dose
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Water treatment
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Averaging
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 3 Sampling and analysis
Regulation 11

PART 1 General

Samples: general
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Analysing samples
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Authorisation of alternative methods of analysis
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Sampling and analysis by persons other than local authorities
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 2 Analytical methods

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

PART 3 Monitoring for indicative dose and analytical performance characteristics

Monitoring for compliance with the indicative dose
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Screening for certain radionuclides, or screening for an individual radionuclide
7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Screening strategies for gross alpha activity and gross beta activity
9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Calculation of the indicative dose
12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Performance characteristics and methods of analysis
14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 4 Records
Regulations 12 and 13

Initial records
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Additional records
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SCHEDULE 5 Fees
Regulation 21

Fee
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Persons liable to pay
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .