2 Interpretation
In these Regulations—
“the 1987 Regulations” (“Rheoliadau 1987”) means the Income Support (General) Regulations 1987; and
“the 2007 Regulations” (“Rheoliadau 2007”) means the National Health Service (Travelling Expenses and Remission of Charges) (Wales) Regulations 2007.
S.I.1987/1967.
S.I.2007/1104 (W.116). Relevant amending instruments are S.I.2008/1480 (W.153), S.I.2009/54 (W.18), S.I.2010/1237 (W.107), S.I.2010/2759 (W.231) and S.I.2011/681(W.100).