PART 3 MISCELLANEOUS AND GENERAL

20 Saving for SP Manweb plc
This Order does not authorise the acquisition, extinguishment or interference with any rights of SP Manweb plc in respect of its existing overhead electric cable within the land shown marked 1a and 1c on the land plan.