2017 No. 1197 (W. 290)
Infrastructure Planning
The Clocaenog Forest Wind Farm (Amendment) Order 2017
Made 29 November 2017
Coming into force 8 December 2017

Innogy Renewables UK Limited has made an application to the Welsh Ministers under paragraph 2(4) of Schedule 6 to the Planning Act 2008 for changes to the Clocaenog Forest Wind Farm Order 2014 that are not material.
Company number 2550622 Innogy Renewables UK Limited (formerly RWE Innogy UK Limited) is the person who applied for the Clocaenog Forest Wind Farm Order 2014.
2008 c. 29. Paragraph 2 of Schedule 6 was amended by paragraph 4 of Schedule 8 to the Marine and Coastal Access Act 2009 (c. 23); by paragraph 72 of Schedule 13 and by Schedule 25 to the Localism Act 2011 (c. 20); by section 28 of the Infrastructure Act 2015 (c. 7); and by paragraph 8(3) of Schedule 7 to the Wales Act 2017 (c. 4).
S.I. 2014/2441.
The Welsh Ministers have had regard to the effect of the changes on the Clocaenog Forest Wind Farm Order 2014 as originally made and are satisfied that the changes are not material.
The Welsh Ministers, having considered the application, the responses to the publicity and consultation required by regulations 6 and 7 of the Infrastructure Planning (Changes to, and Revocation of, Development Consent Orders) Regulations 2011 have decided to make the changes on terms that in the opinion of the Welsh Ministers are not materially different from those proposed in the original application.
S.I. 2011/2055. Regulations 6 and 7 were both amended by S.I. 2012/635 and 2015/760.
Accordingly, the Welsh Ministers, in exercise of the powers in paragraph 2(1) and (9) of Schedule 6 to the Planning Act 2008, make the following Order—