The National Health Service (General Medical Services Contracts) (Prescription of Drugs Etc.) (Wales) (Amendment) (No. 2) Regulations 2024
Welsh Statutory Instruments
2024 No. 1065 (W. 178)
National Health Service, Wales
The National Health Service (General Medical Services Contracts) (Prescription of Drugs Etc.) (Wales) (Amendment) (No. 2) Regulations 2024
Made at 9.18 a.m. on 25 October 2024
Laid before Senedd Cymru at 3.45 p.m. on 25 October 2024
Coming into force 15 November 2024

The Welsh Ministers in exercise of the powers conferred by sections 46(2), 203(9) and (10) and 204(1)(b) of the National Health Service (Wales) Act 2006, make the following Regulations.
2006 c. 42.