PART 2 Amendments to the Approved Inspectors Regulations

10 Amendments as to Schedule 1
In Schedule 1 (forms)—
(a) in form 1 (initial notice), as a final paragraph, before the signature block insert—

“I (the registered building control approver) confirm that none of the work to which this notice relates is higher-risk building work.”

;
(b) in form 2 (amendment notice), as a final paragraph, before the signature block insert—

“I (the registered building control approver) confirm that none of the work to which this notice relates is higher-risk building work.”

;
(c) in form 3 (plans certificate), as a final paragraph, before the signature block insert—

“I (the registered building control approver) confirm that none of the work to which this certificate relates is higher-risk building work.”

;
(d) in form 4 (combined initial notice and plans certificate), as a final paragraph, before the signature block insert—

“I (the registered building control approver) confirm that none of the work to which this notice relates is higher-risk building work.”

;
(e) in form 5 (final certificate), as a final paragraph, before the signature block insert—

“I (the registered building control approver) confirm that none of the work to which this certificate relates is higher-risk building work.”

;
(f) omit forms 6 to 8;
(g) in the appropriate place, in numerical order, insert each of the new forms set out in Schedule 1 to these Regulations.
Note there is no Form 6(W).